Table 140: b(E) × 10^6 [cm^2g^{−1}] for Cesium fluoride (CsF)

⟨Z/A⟩ = 0.42132

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.2915 0.4882 0.3881 2.1679 5. 1.7810 1.4610 0.4141 3.6561 10. 2.1794 2.2166 0.4053 4.8014 20. 2.5885 2.9458 0.3856 5.9200 50. 3.1258 4.0359 0.3733 7.5350 100. 3.5097 4.7638 0.3652 8.6386 200. 3.8623 5.4151 0.3612 9.6387 500. 4.2616 6.0192 0.3612 10.6420 1000. 4.5045 6.3433 0.3670 11.2148 2000. 4.6953 6.5779 0.3760 11.6493 5000. 4.8743 6.7752 0.3926 12.0421 10000. 4.9639 6.8668 0.4092 12.2399 20000. 5.0238 6.9265 0.4285 12.3787 50000. 5.0735 6.9712 0.4586 12.5033 100000. 5.0959 6.9901 0.4843 12.5703