0 0.25 0.5 0.75 1

1.61.822.22.4

Entries 0

1.5 2.0 2.5 Γ_WΜGeVΝ

ALEPH 2.14Α0.11 DELPHI 2.39Α0.17 L3 2.24Α0.15 OPAL 2.00Α0.14

LEP2 preliminary 2.196Α0.083_{χ2/dof = 37 / 33}

CDF 2.035Α0.064 D∅ preliminary 2.10Α0.11

Tevatron ΜRun-1/2Ν 2.049Α0.058_{χ2/dof = 4.8 / 6}

2.097Α0.046