0

0.25

0.5

0.75

1

80 80.2 80.4 80.6 80.8 81

Entries 0

80.0 81.0 M_WΜGeVΝ

ALEPH 80.440Α0.051 DELPHI 80.336Α0.067 L3 80.270Α0.055 OPAL 80.415Α0.053

LEP2 preliminary 80.376Α0.033

χ^2/dof = 49 / 41

CDF 80.418Α0.042 D∅ 80.483Α0.084

Tevatron ΜRun-1/2Ν 80.430Α0.040

χ^2/dof = 0.6 / 2

Overall average 80.398Α0.025