)^2

(GeV/c 0M 0 100 200 300 400 500 600

)^2 (GeV/c

1/2M

0

50

100

150

200

250

300 CDF Run II Preliminary^{-1}L=1.4 fb

MET+jets inclusive <0μ =5, β =0, tan 0A

no mSUGRA solution

)_1^0χ∼

) < m( τ∼m(

) sleptons

LEP (M

)_{1+χ}∼

LEP (M observed limit 95% C.L. expected limit

Theoretical uncertainties included in the calculation of the limit

0 0

)