Table 330: b(E) × 10^6 [cm^2g^{−1}] for Lead fluoride [PbF_2]

⟨Z/A⟩ = 0.40784

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.6940 0.3695 0.3769 2.4403 5. 2.3489 1.6807 0.4018 4.4314 10. 2.8837 2.7009 0.3934 5.9780 20. 3.4328 3.6509 0.3789 7.4626 50. 4.1517 5.0966 0.3627 9.6109 100. 4.6631 6.0525 0.3550 11.0706 200. 5.1301 6.9003 0.3513 12.3817 500. 5.6544 7.6788 0.3513 13.6845 1000. 5.9702 8.0929 0.3568 14.4199 2000. 6.2160 8.3908 0.3656 14.9724 5000. 6.4442 8.6402 0.3816 15.4659 10000. 6.5573 8.7553 0.3975 15.7100 20000. 6.6321 8.8303 0.4161 15.8784 50000. 6.6942 8.8862 0.4450 16.0254 100000. 6.7216 8.9096 0.4698 16.1011