Table 335: b(E) × 10^6 [cm^2g^{−1}] for Lutetium aluminum oxide (1) [LuAlO_3] ⟨Z/A⟩ = 0.43209

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3405 0.3983 0.3939 2.1326 5. 1.8527 1.4180 0.4197 3.6904 10. 2.2705 2.2124 0.4104 4.8933 20. 2.6997 2.9674 0.3911 6.0583 50. 3.2629 4.1041 0.3770 7.7440 100. 3.6647 4.8606 0.3686 8.8939 200. 4.0333 5.5336 0.3645 9.9313 500. 4.4489 6.1585 0.3644 10.9718 1000. 4.7009 6.4938 0.3702 11.5649 2000. 4.8982 6.7353 0.3794 12.0129 5000. 5.0827 6.9380 0.3964 12.4171 10000. 5.1747 7.0320 0.4133 12.6201 20000. 5.2362 7.0931 0.4331 12.7623 50000. 5.2870 7.1391 0.4639 12.8901 100000. 5.3098 7.1582 0.4903 12.9583