b(E) × 10^6 [cm^2g^{−1}] for

Freon-13 (CF_3Cl) ⟨Z/A⟩ = 0.47966

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.4058 0.1869 0.4468 1.0395 5. 0.5512 0.4576 0.4742 1.4830 10. 0.6698 0.6788 0.4614 1.8101 20. 0.7933 0.9155 0.4416 2.1504 50. 0.9586 1.2511 0.4196 2.6294 100. 1.0798 1.4854 0.4090 2.9742 200. 1.1939 1.7009 0.4037 3.2985 500. 1.3271 1.9137 0.4031 3.6440 1000. 1.4111 2.0375 0.4097 3.8584 2000. 1.4797 2.1259 0.4206 4.0261 5000. 1.5468 2.2024 0.4405 4.1897 10000. 1.5817 2.2385 0.4606 4.2808 20000. 1.6062 2.2613 0.4842 4.3516 50000. 1.6262 2.2796 0.5210 4.4268 100000. 1.6357 2.2871 0.5525 4.4754