b(E) × 10^6 [cm^2g^{−1}] for

Freon-13i1 (CF_3I) ⟨Z/A⟩ = 0.43997

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.0150 0.3983 0.4071 1.8204 5. 1.3970 1.1523 0.4335 2.9827 10. 1.7081 1.7411 0.4234 3.8727 20. 2.0281 2.3164 0.4033 4.7478 50. 2.4492 3.1712 0.3881 6.0086 100. 2.7511 3.7450 0.3792 6.8753 200. 3.0293 4.2599 0.3749 7.6641 500. 3.3455 4.7415 0.3747 8.4617 1000. 3.5387 5.0034 0.3807 8.9228 2000. 3.6914 5.1922 0.3903 9.2739 5000. 3.8353 5.3518 0.4080 9.5951 10000. 3.9078 5.4260 0.4257 9.7596 20000. 3.9565 5.4743 0.4464 9.8772 50000. 3.9971 5.5108 0.4787 9.9865 100000. 4.0154 5.5259 0.5063 10.0476