b(E) × 10^6 [cm^2g^{−1}] for calcium tungstate (CaWO_4)

⟨Z/A⟩ = 0.43761

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3223 0.3821 0.3956 2.1001 5. 1.8274 1.3865 0.4215 3.6354 10. 2.2395 2.1696 0.4121 4.8212 20. 2.6628 2.9144 0.3931 5.9702 50. 3.2182 4.0351 0.3784 7.6318 100. 3.6147 4.7812 0.3700 8.7659 200. 3.9783 5.4468 0.3658 9.7909 500. 4.3886 6.0630 0.3657 10.8174 1000. 4.6374 6.3938 0.3715 11.4027 2000. 4.8323 6.6323 0.3807 11.8453 5000. 5.0146 6.8328 0.3978 12.2451 10000. 5.1055 6.9257 0.4149 12.4460 20000. 5.1664 6.9861 0.4347 12.5871 50000. 5.2165 7.0316 0.4657 12.7139 100000. 5.2391 7.0503 0.4923 12.7818