b(E) × 10^6 [cm^2g^{−1}] for carbon tetrachloride (CCl_4)

⟨Z/A⟩ = 0.49107

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.5597 0.2631 0.4321 1.2549 5. 0.7613 0.6443 0.4599 1.8656 10. 0.9252 0.9492 0.4485 2.3229 20. 1.0948 1.2713 0.4299 2.7959 50. 1.3201 1.7300 0.4093 3.4595 100. 1.4840 2.0475 0.3993 3.9308 200. 1.6372 2.3406 0.3944 4.3721 500. 1.8152 2.6230 0.3940 4.8322 1000. 1.9267 2.7796 0.4003 5.1067 2000. 2.0168 2.8952 0.4107 5.3226 5000. 2.1040 2.9937 0.4298 5.5275 10000. 2.1491 3.0400 0.4491 5.6381 20000. 2.1809 3.0693 0.4715 5.7217 50000. 2.2058 3.0931 0.5066 5.8054 100000. 2.2179 3.1027 0.5366 5.8572