b(E) × 10^6 [cm^2g^{−1}] for cellulose nitrate [(C_{12}H_{14}O_4(ONO_2)_6)_n] ⟨Z/A⟩ = 0.51424

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2836 0.1250 0.4657 0.8742 5. 0.3844 0.3077 0.4930 1.1851 10. 0.4675 0.4634 0.4785 1.4094 20. 0.5549 0.6331 0.4567 1.6447 50. 0.6735 0.8719 0.4329 1.9784 100. 0.7617 1.0408 0.4214 2.2239 200. 0.8455 1.1964 0.4155 2.4574 500. 0.9443 1.3556 0.4146 2.7146 1000. 1.0075 1.4531 0.4214 2.8820 2000. 1.0599 1.5213 0.4327 3.0139 5000. 1.1120 1.5814 0.4537 3.1472 10000. 1.1395 1.6099 0.4750 3.2244 20000. 1.1588 1.6278 0.4999 3.2865 50000. 1.1754 1.6420 0.5389 3.3563 100000. 1.1830 1.6478 0.5724 3.4034