b(E) × 10^6 [cm^2g^{−1}] for cerium fluoride (CeF_3)

⟨Z/A⟩ = 0.43123

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.1605 0.4261 0.3989 1.9855 5. 1.5999 1.2972 0.4250 3.3221 10. 1.9578 1.9757 0.4155 4.3491 20. 2.3256 2.6318 0.3957 5.3532 50. 2.8089 3.6114 0.3816 6.8019 100. 3.1546 4.2665 0.3729 7.7941 200. 3.4726 4.8528 0.3688 8.6941 500. 3.8328 5.3984 0.3687 9.5999 1000. 4.0521 5.6931 0.3746 10.1198 2000. 4.2248 5.9056 0.3840 10.5144 5000. 4.3870 6.0847 0.4012 10.8729 10000. 4.4683 6.1679 0.4184 11.0546 20000. 4.5227 6.2220 0.4385 11.1832 50000. 4.5680 6.2628 0.4699 11.3007 100000. 4.5885 6.2798 0.4967 11.3649