b(E) × 10^6 [cm^2g^{−1}] for hydrogen gas (H_2), Z = 1, A =1.00794(7)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.1091 0.0349 0.5501 0.6940 5. 0.1526 0.1043 0.5796 0.8365 10. 0.1935 0.1903 0.5568 0.9405 20. 0.2407 0.2829 0.5255 1.0491 50. 0.3114 0.4120 0.4908 1.2142 100. 0.3678 0.5039 0.4736 1.3453 200. 0.4246 0.5912 0.4640 1.4798 500. 0.4951 0.6944 0.4622 1.6517 1000. 0.5441 0.7614 0.4676 1.7732 2000. 0.5876 0.8134 0.4804 1.8814 5000. 0.6356 0.8614 0.5051 2.0020 10000. 0.6642 0.8837 0.5308 2.0788 20000. 0.6867 0.8976 0.5618 2.1461 50000. 0.7080 0.9077 0.6103 2.2260 100000. 0.7192 0.9117 0.6529 2.2838