Muons in amber (C_{10}H_{16}O)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55179 1.100 63.2 0.11934 3.4098 0.1335 2.5610 3.0701 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.093 8.093 6.818 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.308 6.308 1.248 × 10^0 20.0 MeV 6.802 × 10^1 4.922 4.922 2.337 × 10^0 30.0 MeV 8.509 × 10^1 3.816 3.816 4.677 × 10^0 40.0 MeV 1.003 × 10^2 3.256 3.256 7.532 × 10^0 80.0 MeV 1.527 × 10^2 2.438 2.438 2.217 × 10^1 100. MeV 1.764 × 10^2 2.282 2.282 3.068 × 10^1 140. MeV 2.218 × 10^2 2.123 2.123 4.893 × 10^1 200. MeV 2.868 × 10^2 2.030 2.031 7.794 × 10^1 300. MeV 3.917 × 10^2 1.993 0.000 1.994 1.278 × 10^2 324. MeV 4.161 × 10^2 1.993 0.000 1.993 Minimum ionization 400. MeV 4.945 × 10^2 1.998 0.000 1.998 1.779 × 10^2 800. MeV 8.995 × 10^2 2.069 0.000 0.000 2.069 3.748 × 10^2 1.00 GeV 1.101 × 10^3 2.102 0.000 0.000 2.103 4.706 × 10^2 1.40 GeV 1.502 × 10^3 2.156 0.000 0.001 2.157 6.583 × 10^2 2.00 GeV 2.103 × 10^3 2.215 0.000 0.000 0.001 2.217 9.325 × 10^2 3.00 GeV 3.104 × 10^3 2.283 0.001 0.001 0.001 2.286 1.376 × 10^3 4.00 GeV 4.104 × 10^3 2.331 0.001 0.001 0.002 2.335 1.809 × 10^3 8.00 GeV 8.105 × 10^3 2.439 0.003 0.003 0.004 2.449 3.477 × 10^3 10.0 GeV 1.011 × 10^4 2.472 0.004 0.004 0.005 2.485 4.287 × 10^3 14.0 GeV 1.411 × 10^4 2.521 0.006 0.006 0.007 2.540 5.878 × 10^3 20.0 GeV 2.011 × 10^4 2.569 0.009 0.011 0.009 2.599 8.212 × 10^3 30.0 GeV 3.011 × 10^4 2.622 0.015 0.019 0.014 2.670 1.201 × 10^4 40.0 GeV 4.011 × 10^4 2.658 0.022 0.027 0.018 2.725 1.571 × 10^4 80.0 GeV 8.011 × 10^4 2.742 0.049 0.066 0.035 2.892 2.993 × 10^4 100. GeV 1.001 × 10^5 2.768 0.064 0.088 0.043 2.963 3.676 × 10^4 140. GeV 1.401 × 10^5 2.806 0.095 0.132 0.060 3.093 4.997 × 10^4 200. GeV 2.001 × 10^5 2.847 0.143 0.202 0.084 3.277 6.881 × 10^4 300. GeV 3.001 × 10^5 2.892 0.226 0.322 0.127 3.567 9.805 × 10^4 400. GeV 4.001 × 10^5 2.925 0.313 0.447 0.169 3.853 1.250 × 10^5 800. GeV 8.001 × 10^5 3.004 0.673 0.967 0.341 4.985 2.160 × 10^5 1.00 TeV 1.000 × 10^6 3.030 0.859 1.237 0.428 5.554 2.540 × 10^5 1.19 TeV 1.194 × 10^6 3.050 1.040 1.496 0.515 6.101 Muon critical energy 1.40 TeV 1.400 × 10^6 3.069 1.234 1.773 0.607 6.684 3.196 × 10^5 2.00 TeV 2.000 × 10^6 3.111 1.811 2.596 0.879 8.398 3.995 × 10^5 3.00 TeV 3.000 × 10^6 3.159 2.780 3.966 1.348 11.253 5.020 × 10^5 4.00 TeV 4.000 × 10^6 3.194 3.766 5.357 1.824 14.141 5.812 × 10^5 8.00 TeV 8.000 × 10^6 3.279 7.761 10.958 3.809 25.809 7.875 × 10^5 10.0 TeV 1.000 × 10^7 3.308 9.783 13.780 4.832 31.704 8.573 × 10^5 14.0 TeV 1.400 × 10^7 3.351 13.819 19.403 6.940 43.513 9.646 × 10^5 20.0 TeV 2.000 × 10^7 3.397 19.927 27.884 10.181 61.389 1.080 × 10^6 30.0 TeV 3.000 × 10^7 3.450 30.098 41.995 15.807 91.351 1.213 × 10^6 40.0 TeV 4.000 × 10^7 3.489 40.328 56.153 21.584 121.554 1.307 × 10^6 80.0 TeV 8.000 × 10^7 3.584 81.338 112.834 45.842 243.598 1.535 × 10^6 100. TeV 1.000 × 10^8 3.615 101.896 141.209 58.422 305.142 1.609 × 10^6