Muons in cesium iodide (CsI)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.41569 4.510 553.1 0.25381 2.6657 0.0395 3.3353 6.2807 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.423 4.423 1.283 × 10^0 14.0 MeV 5.616 × 10^1 3.495 3.495 2.310 × 10^0 20.0 MeV 6.802 × 10^1 2.763 2.763 4.262 × 10^0 30.0 MeV 8.509 × 10^1 2.171 2.171 8.399 × 10^0 40.0 MeV 1.003 × 10^2 1.869 1.869 1.339 × 10^1 80.0 MeV 1.527 × 10^2 1.432 1.432 3.859 × 10^1 100. MeV 1.764 × 10^2 1.355 1.355 5.298 × 10^1 140. MeV 2.218 × 10^2 1.281 1.281 8.347 × 10^1 200. MeV 2.868 × 10^2 1.247 1.247 1.311 × 10^2 237. MeV 3.260 × 10^2 1.243 1.243 Minimum ionization 300. MeV 3.917 × 10^2 1.248 0.000 0.000 1.249 2.114 × 10^2 400. MeV 4.945 × 10^2 1.269 0.000 0.000 1.269 2.909 × 10^2 800. MeV 8.995 × 10^2 1.356 0.001 0.000 1.357 5.953 × 10^2 1.00 GeV 1.101 × 10^3 1.391 0.001 0.000 1.392 7.407 × 10^2 1.40 GeV 1.502 × 10^3 1.446 0.002 0.000 0.001 1.449 1.022 × 10^3 2.00 GeV 2.103 × 10^3 1.505 0.003 0.001 0.001 1.511 1.427 × 10^3 3.00 GeV 3.104 × 10^3 1.573 0.005 0.003 0.001 1.582 2.073 × 10^3 4.00 GeV 4.104 × 10^3 1.619 0.007 0.006 0.002 1.634 2.694 × 10^3 8.00 GeV 8.105 × 10^3 1.724 0.018 0.017 0.003 1.763 5.042 × 10^3 10.0 GeV 1.011 × 10^4 1.755 0.024 0.024 0.004 1.808 6.161 × 10^3 14.0 GeV 1.411 × 10^4 1.800 0.037 0.040 0.005 1.883 8.328 × 10^3 20.0 GeV 2.011 × 10^4 1.845 0.057 0.065 0.008 1.975 1.144 × 10^4 30.0 GeV 3.011 × 10^4 1.892 0.093 0.113 0.011 2.110 1.633 × 10^4 40.0 GeV 4.011 × 10^4 1.923 0.131 0.165 0.015 2.235 2.094 × 10^4 80.0 GeV 8.011 × 10^4 1.991 0.297 0.397 0.029 2.715 3.714 × 10^4 100. GeV 1.001 × 10^5 2.012 0.384 0.522 0.036 2.955 4.420 × 10^4 140. GeV 1.401 × 10^5 2.042 0.564 0.779 0.050 3.436 5.675 × 10^4 197. GeV 1.976 × 10^5 2.071 0.833 1.168 0.070 4.144 Muon critical energy 200. GeV 2.001 × 10^5 2.073 0.845 1.186 0.071 4.176 7.257 × 10^4 300. GeV 3.001 × 10^5 2.107 1.326 1.866 0.107 5.406 9.357 × 10^4 400. GeV 4.001 × 10^5 2.132 1.822 2.571 0.142 6.668 1.102 × 10^5 800. GeV 8.001 × 10^5 2.191 3.873 5.460 0.287 11.812 1.547 × 10^5 1.00 TeV 1.000 × 10^6 2.210 4.926 6.938 0.361 14.436 1.700 × 10^5 1.40 TeV 1.400 × 10^6 2.240 7.037 9.886 0.511 19.676 1.936 × 10^5 2.00 TeV 2.000 × 10^6 2.271 10.267 14.386 0.739 27.665 2.192 × 10^5 3.00 TeV 3.000 × 10^6 2.308 15.659 21.863 1.131 40.961 2.488 × 10^5 4.00 TeV 4.000 × 10^6 2.334 21.122 29.419 1.528 54.405 2.699 × 10^5 8.00 TeV 8.000 × 10^6 2.399 43.151 59.794 3.174 108.520 3.209 × 10^5 10.0 TeV 1.000 × 10^7 2.420 54.252 75.063 4.019 135.755 3.374 × 10^5 14.0 TeV 1.400 × 10^7 2.452 76.393 105.529 5.754 190.130 3.622 × 10^5 20.0 TeV 2.000 × 10^7 2.487 109.800 151.423 8.414 272.126 3.884 × 10^5 30.0 TeV 3.000 × 10^7 2.527 165.415 227.780 13.007 408.730 4.182 × 10^5 40.0 TeV 4.000 × 10^7 2.556 221.230 304.316 17.708 545.812 4.393 × 10^5 80.0 TeV 8.000 × 10^7 2.628 444.823 610.679 37.330 1095.462 4.900 × 10^5 100. TeV 1.000 × 10^8 2.652 556.808 764.003 47.463 1370.927 5.063 × 10^5