Muons in element 115 (Un)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 115 (Un) [288.192 (6)] ?? 1199.0 0.28871 3.0000 0.6960 3.0000 6.7363 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.475 3.475 1.726 × 10^0 14.0 MeV 5.616 × 10^1 2.815 2.815 3.016 × 10^0 20.0 MeV 6.802 × 10^1 2.270 2.270 5.411 × 10^0 30.0 MeV 8.509 × 10^1 1.814 1.814 1.040 × 10^1 40.0 MeV 1.003 × 10^2 1.576 1.576 1.635 × 10^1 80.0 MeV 1.527 × 10^2 1.227 1.227 4.592 × 10^1 100. MeV 1.764 × 10^2 1.167 1.167 6.268 × 10^1 140. MeV 2.218 × 10^2 1.112 1.112 9.795 × 10^1 200. MeV 2.868 × 10^2 1.092 0.000 1.092 1.526 × 10^2 206. MeV 2.933 × 10^2 1.092 0.000 1.092 Minimum ionization 300. MeV 3.917 × 10^2 1.107 0.000 0.000 1.107 2.437 × 10^2 400. MeV 4.945 × 10^2 1.135 0.000 0.000 1.136 3.329 × 10^2 800. MeV 8.995 × 10^2 1.238 0.001 0.000 1.240 6.688 × 10^2 1.00 GeV 1.101 × 10^3 1.276 0.002 0.000 1.279 8.275 × 10^2 1.40 GeV 1.502 × 10^3 1.334 0.003 0.000 1.338 1.133 × 10^3 2.00 GeV 2.103 × 10^3 1.395 0.005 0.000 0.001 1.401 1.571 × 10^3 3.00 GeV 3.104 × 10^3 1.461 0.009 0.003 0.001 1.475 2.265 × 10^3 4.00 GeV 4.104 × 10^3 1.506 0.014 0.006 0.001 1.529 2.930 × 10^3 8.00 GeV 8.105 × 10^3 1.605 0.034 0.025 0.003 1.669 5.425 × 10^3 10.0 GeV 1.011 × 10^4 1.634 0.046 0.037 0.004 1.721 6.604 × 10^3 14.0 GeV 1.411 × 10^4 1.675 0.070 0.061 0.005 1.813 8.867 × 10^3 20.0 GeV 2.011 × 10^4 1.716 0.109 0.103 0.007 1.935 1.207 × 10^4 30.0 GeV 3.011 × 10^4 1.757 0.178 0.184 0.010 2.132 1.699 × 10^4 40.0 GeV 4.011 × 10^4 1.785 0.252 0.274 0.014 2.326 2.148 × 10^4 80.0 GeV 8.011 × 10^4 1.847 0.570 0.673 0.027 3.119 3.629 × 10^4 100. GeV 1.001 × 10^5 1.865 0.739 0.889 0.033 3.529 4.231 × 10^4 111. GeV 1.109 × 10^5 1.874 0.831 1.007 0.037 3.750 Muon critical energy 140. GeV 1.401 × 10^5 1.893 1.084 1.334 0.047 4.360 5.250 × 10^4 200. GeV 2.001 × 10^5 1.923 1.625 2.040 0.066 5.656 6.456 × 10^4 300. GeV 3.001 × 10^5 1.956 2.546 3.219 0.099 7.822 7.954 × 10^4 400. GeV 4.001 × 10^5 1.979 3.497 4.441 0.132 10.052 9.079 × 10^4 800. GeV 8.001 × 10^5 2.036 7.418 9.454 0.267 19.178 1.191 × 10^5 1.00 TeV 1.000 × 10^6 2.055 9.430 12.019 0.336 23.842 1.285 × 10^5 1.40 TeV 1.400 × 10^6 2.083 13.457 17.131 0.476 33.149 1.426 × 10^5 2.00 TeV 2.000 × 10^6 2.114 19.611 24.934 0.688 47.349 1.577 × 10^5 3.00 TeV 3.000 × 10^6 2.149 29.875 37.897 1.051 70.974 1.749 × 10^5 4.00 TeV 4.000 × 10^6 2.174 40.266 50.998 1.420 94.860 1.870 × 10^5 8.00 TeV 8.000 × 10^6 2.236 82.121 103.652 2.947 190.958 2.161 × 10^5 10.0 TeV 1.000 × 10^7 2.256 103.195 130.116 3.730 239.299 2.255 × 10^5 14.0 TeV 1.400 × 10^7 2.287 145.228 182.922 5.336 335.776 2.395 × 10^5 20.0 TeV 2.000 × 10^7 2.320 208.612 262.468 7.796 481.199 2.544 × 10^5 30.0 TeV 3.000 × 10^7 2.359 314.232 394.792 12.043 723.429 2.712 × 10^5 40.0 TeV 4.000 × 10^7 2.387 420.220 527.420 16.388 966.417 2.831 × 10^5 80.0 TeV 8.000 × 10^7 2.456 844.120 1058.295 34.514 1939.388 3.117 × 10^5 100. TeV 1.000 × 10^8 2.479 1056.190 1323.970 43.870 2426.511 3.209 × 10^5