Muons in flerovium (Fl)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 114 (Fl) [289.187 (5)] ?? 1185.0 0.28779 3.0000 0.6923 3.0000 6.7249 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.447 3.447 1.738 × 10^0 14.0 MeV 5.616 × 10^1 2.790 2.790 3.039 × 10^0 20.0 MeV 6.802 × 10^1 2.249 2.249 5.457 × 10^0 30.0 MeV 8.509 × 10^1 1.796 1.796 1.049 × 10^1 40.0 MeV 1.003 × 10^2 1.561 1.561 1.650 × 10^1 80.0 MeV 1.527 × 10^2 1.214 1.215 4.638 × 10^1 100. MeV 1.764 × 10^2 1.154 1.155 6.331 × 10^1 140. MeV 2.218 × 10^2 1.100 1.100 9.895 × 10^1 200. MeV 2.868 × 10^2 1.080 0.000 1.081 1.542 × 10^2 207. MeV 2.943 × 10^2 1.080 0.000 1.080 Minimum ionization 300. MeV 3.917 × 10^2 1.095 0.000 0.000 1.095 2.463 × 10^2 400. MeV 4.945 × 10^2 1.123 0.000 0.000 1.124 3.364 × 10^2 800. MeV 8.995 × 10^2 1.225 0.001 0.000 1.226 6.760 × 10^2 1.00 GeV 1.101 × 10^3 1.262 0.002 0.000 1.264 8.366 × 10^2 1.40 GeV 1.502 × 10^3 1.319 0.003 0.000 1.323 1.145 × 10^3 2.00 GeV 2.103 × 10^3 1.379 0.005 0.000 0.001 1.385 1.588 × 10^3 3.00 GeV 3.104 × 10^3 1.445 0.009 0.003 0.001 1.458 2.290 × 10^3 4.00 GeV 4.104 × 10^3 1.489 0.014 0.006 0.001 1.511 2.964 × 10^3 8.00 GeV 8.105 × 10^3 1.587 0.034 0.025 0.003 1.649 5.487 × 10^3 10.0 GeV 1.011 × 10^4 1.615 0.045 0.036 0.004 1.701 6.681 × 10^3 14.0 GeV 1.411 × 10^4 1.656 0.068 0.060 0.005 1.791 8.972 × 10^3 20.0 GeV 2.011 × 10^4 1.696 0.107 0.101 0.007 1.911 1.221 × 10^4 30.0 GeV 3.011 × 10^4 1.737 0.175 0.181 0.010 2.104 1.720 × 10^4 40.0 GeV 4.011 × 10^4 1.764 0.247 0.269 0.014 2.296 2.174 × 10^4 80.0 GeV 8.011 × 10^4 1.825 0.559 0.661 0.027 3.073 3.676 × 10^4 100. GeV 1.001 × 10^5 1.844 0.724 0.873 0.033 3.476 4.288 × 10^4 111. GeV 1.116 × 10^5 1.853 0.819 0.996 0.037 3.707 Muon critical energy 140. GeV 1.401 × 10^5 1.871 1.062 1.310 0.047 4.292 5.322 × 10^4 200. GeV 2.001 × 10^5 1.900 1.591 2.004 0.066 5.563 6.548 × 10^4 300. GeV 3.001 × 10^5 1.933 2.493 3.161 0.099 7.688 8.072 × 10^4 400. GeV 4.001 × 10^5 1.956 3.425 4.361 0.132 9.876 9.217 × 10^4 800. GeV 8.001 × 10^5 2.012 7.266 9.282 0.267 18.830 1.210 × 10^5 1.00 TeV 1.000 × 10^6 2.031 9.236 11.800 0.336 23.406 1.305 × 10^5 1.40 TeV 1.400 × 10^6 2.059 13.181 16.819 0.476 32.537 1.450 × 10^5 2.00 TeV 2.000 × 10^6 2.089 19.210 24.480 0.688 46.469 1.603 × 10^5 3.00 TeV 3.000 × 10^6 2.123 29.264 37.206 1.051 69.647 1.778 × 10^5 4.00 TeV 4.000 × 10^6 2.148 39.443 50.069 1.419 93.082 1.902 × 10^5 8.00 TeV 8.000 × 10^6 2.209 80.445 101.761 2.945 187.363 2.199 × 10^5 10.0 TeV 1.000 × 10^7 2.229 101.090 127.742 3.728 234.792 2.294 × 10^5 14.0 TeV 1.400 × 10^7 2.260 142.267 179.584 5.334 329.448 2.437 × 10^5 20.0 TeV 2.000 × 10^7 2.293 204.360 257.678 7.794 472.128 2.588 × 10^5 30.0 TeV 3.000 × 10^7 2.331 307.830 387.590 12.040 709.794 2.760 × 10^5 40.0 TeV 4.000 × 10^7 2.359 411.661 517.801 16.384 948.207 2.881 × 10^5 80.0 TeV 8.000 × 10^7 2.427 826.936 1038.988 34.501 1902.853 3.173 × 10^5 100. TeV 1.000 × 10^8 2.449 1034.690 1299.810 43.850 2380.802 3.267 × 10^5