Muons in gel in photographic emulsion

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53973 1.291 74.8 0.10102 3.4418 0.1709 2.7058 3.2687 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.747 7.747 7.134 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.043 6.043 1.304 × 10^0 20.0 MeV 6.802 × 10^1 4.719 4.719 2.441 × 10^0 30.0 MeV 8.509 × 10^1 3.661 3.661 4.880 × 10^0 40.0 MeV 1.003 × 10^2 3.126 3.126 7.855 × 10^0 80.0 MeV 1.527 × 10^2 2.347 2.347 2.309 × 10^1 100. MeV 1.764 × 10^2 2.200 2.200 3.191 × 10^1 140. MeV 2.218 × 10^2 2.048 2.048 5.085 × 10^1 200. MeV 2.868 × 10^2 1.960 1.960 8.091 × 10^1 300. MeV 3.917 × 10^2 1.926 0.000 1.926 1.325 × 10^2 318. MeV 4.105 × 10^2 1.926 0.000 1.926 Minimum ionization 400. MeV 4.945 × 10^2 1.932 0.000 1.932 1.844 × 10^2 800. MeV 8.995 × 10^2 2.004 0.000 0.000 2.004 3.877 × 10^2 1.00 GeV 1.101 × 10^3 2.037 0.000 0.000 2.038 4.867 × 10^2 1.40 GeV 1.502 × 10^3 2.091 0.000 0.001 2.092 6.803 × 10^2 2.00 GeV 2.103 × 10^3 2.150 0.001 0.000 0.001 2.152 9.629 × 10^2 3.00 GeV 3.104 × 10^3 2.218 0.001 0.001 0.001 2.221 1.420 × 10^3 4.00 GeV 4.104 × 10^3 2.265 0.001 0.001 0.002 2.269 1.865 × 10^3 8.00 GeV 8.105 × 10^3 2.373 0.003 0.003 0.004 2.383 3.580 × 10^3 10.0 GeV 1.011 × 10^4 2.406 0.004 0.004 0.005 2.419 4.412 × 10^3 14.0 GeV 1.411 × 10^4 2.453 0.007 0.007 0.007 2.474 6.046 × 10^3 20.0 GeV 2.011 × 10^4 2.501 0.010 0.012 0.009 2.533 8.441 × 10^3 30.0 GeV 3.011 × 10^4 2.553 0.017 0.021 0.014 2.605 1.233 × 10^4 40.0 GeV 4.011 × 10^4 2.589 0.024 0.031 0.018 2.662 1.613 × 10^4 80.0 GeV 8.011 × 10^4 2.670 0.055 0.075 0.034 2.835 3.066 × 10^4 100. GeV 1.001 × 10^5 2.696 0.072 0.098 0.043 2.909 3.763 × 10^4 140. GeV 1.401 × 10^5 2.733 0.106 0.148 0.059 3.047 5.106 × 10^4 200. GeV 2.001 × 10^5 2.773 0.160 0.226 0.084 3.243 7.014 × 10^4 300. GeV 3.001 × 10^5 2.818 0.253 0.360 0.126 3.556 9.957 × 10^4 400. GeV 4.001 × 10^5 2.850 0.349 0.499 0.167 3.865 1.265 × 10^5 800. GeV 8.001 × 10^5 2.927 0.749 1.078 0.338 5.092 2.164 × 10^5 1.00 TeV 1.000 × 10^6 2.952 0.956 1.377 0.425 5.710 2.535 × 10^5 1.07 TeV 1.068 × 10^6 2.959 1.026 1.478 0.455 5.919 Muon critical energy 1.40 TeV 1.400 × 10^6 2.990 1.373 1.973 0.602 6.939 3.169 × 10^5 2.00 TeV 2.000 × 10^6 3.031 2.013 2.887 0.872 8.804 3.936 × 10^5 3.00 TeV 3.000 × 10^6 3.079 3.087 4.408 1.337 11.910 4.909 × 10^5 4.00 TeV 4.000 × 10^6 3.113 4.180 5.950 1.809 15.052 5.654 × 10^5 8.00 TeV 8.000 × 10^6 3.196 8.606 12.163 3.776 27.742 7.582 × 10^5 10.0 TeV 1.000 × 10^7 3.224 10.845 15.292 4.790 34.151 8.231 × 10^5 14.0 TeV 1.400 × 10^7 3.266 15.312 21.527 6.878 46.984 9.225 × 10^5 20.0 TeV 2.000 × 10^7 3.311 22.072 30.932 10.087 66.402 1.029 × 10^6 30.0 TeV 3.000 × 10^7 3.363 33.326 46.580 15.657 98.927 1.152 × 10^6 40.0 TeV 4.000 × 10^7 3.401 44.642 62.279 21.375 131.697 1.239 × 10^6 80.0 TeV 8.000 × 10^7 3.494 90.017 125.128 45.375 264.014 1.450 × 10^6 100. TeV 1.000 × 10^8 3.525 112.766 156.589 57.818 330.698 1.517 × 10^6