Muons in lawrencium (Lr)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 103 (Lr) [262.110 (2)] ?? 1034.0 0.26710 3.0000 0.6045 3.0000 6.4555 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.583 3.583 1.650 × 10^0 14.0 MeV 5.616 × 10^1 2.882 2.882 2.906 × 10^0 20.0 MeV 6.802 × 10^1 2.312 2.312 5.253 × 10^0 30.0 MeV 8.509 × 10^1 1.839 1.839 1.016 × 10^1 40.0 MeV 1.003 × 10^2 1.595 1.595 1.603 × 10^1 80.0 MeV 1.527 × 10^2 1.236 1.236 4.534 × 10^1 100. MeV 1.764 × 10^2 1.174 1.174 6.198 × 10^1 140. MeV 2.218 × 10^2 1.117 1.117 9.706 × 10^1 200. MeV 2.868 × 10^2 1.096 1.096 1.515 × 10^2 209. MeV 2.968 × 10^2 1.096 0.000 1.096 Minimum ionization 300. MeV 3.917 × 10^2 1.109 0.000 0.000 1.110 2.423 × 10^2 400. MeV 4.945 × 10^2 1.136 0.000 0.000 1.137 3.314 × 10^2 800. MeV 8.995 × 10^2 1.232 0.001 0.000 1.234 6.681 × 10^2 1.00 GeV 1.101 × 10^3 1.268 0.002 0.000 1.270 8.278 × 10^2 1.40 GeV 1.502 × 10^3 1.323 0.003 0.000 1.326 1.136 × 10^3 2.00 GeV 2.103 × 10^3 1.381 0.005 0.001 0.001 1.387 1.577 × 10^3 3.00 GeV 3.104 × 10^3 1.445 0.008 0.003 0.001 1.458 2.279 × 10^3 4.00 GeV 4.104 × 10^3 1.488 0.012 0.006 0.001 1.509 2.953 × 10^3 8.00 GeV 8.105 × 10^3 1.584 0.031 0.024 0.003 1.642 5.484 × 10^3 10.0 GeV 1.011 × 10^4 1.612 0.041 0.035 0.004 1.692 6.684 × 10^3 14.0 GeV 1.411 × 10^4 1.652 0.062 0.057 0.005 1.777 8.989 × 10^3 20.0 GeV 2.011 × 10^4 1.691 0.097 0.096 0.007 1.891 1.226 × 10^4 30.0 GeV 3.011 × 10^4 1.732 0.158 0.170 0.011 2.072 1.731 × 10^4 40.0 GeV 4.011 × 10^4 1.759 0.224 0.252 0.014 2.250 2.194 × 10^4 80.0 GeV 8.011 × 10^4 1.819 0.507 0.616 0.027 2.971 3.737 × 10^4 100. GeV 1.001 × 10^5 1.838 0.656 0.813 0.034 3.342 4.371 × 10^4 120. GeV 1.197 × 10^5 1.853 0.805 1.008 0.040 3.707 Muon critical energy 140. GeV 1.401 × 10^5 1.865 0.963 1.218 0.047 4.095 5.451 × 10^4 200. GeV 2.001 × 10^5 1.894 1.443 1.860 0.067 5.266 6.741 × 10^4 300. GeV 3.001 × 10^5 1.927 2.262 2.932 0.100 7.223 8.357 × 10^4 400. GeV 4.001 × 10^5 1.950 3.108 4.043 0.134 9.236 9.579 × 10^4 800. GeV 8.001 × 10^5 2.006 6.594 8.600 0.270 17.472 1.268 × 10^5 1.00 TeV 1.000 × 10^6 2.025 8.383 10.931 0.339 21.680 1.370 × 10^5 1.40 TeV 1.400 × 10^6 2.052 11.966 15.578 0.480 30.078 1.526 × 10^5 2.00 TeV 2.000 × 10^6 2.082 17.441 22.669 0.694 42.889 1.693 × 10^5 3.00 TeV 3.000 × 10^6 2.117 26.573 34.451 1.061 64.203 1.882 × 10^5 4.00 TeV 4.000 × 10^6 2.142 35.820 46.357 1.433 85.754 2.016 × 10^5 8.00 TeV 8.000 × 10^6 2.202 73.072 94.210 2.974 172.460 2.339 × 10^5 10.0 TeV 1.000 × 10^7 2.223 91.831 118.260 3.764 216.080 2.442 × 10^5 14.0 TeV 1.400 × 10^7 2.253 129.246 166.250 5.385 303.137 2.598 × 10^5 20.0 TeV 2.000 × 10^7 2.286 185.670 238.540 7.868 434.366 2.762 × 10^5 30.0 TeV 3.000 × 10^7 2.324 279.694 358.798 12.155 652.974 2.949 × 10^5 40.0 TeV 4.000 × 10^7 2.352 374.051 479.331 16.541 872.277 3.081 × 10^5 80.0 TeV 8.000 × 10^7 2.419 751.448 961.805 34.837 1750.511 3.398 × 10^5 100. TeV 1.000 × 10^8 2.442 940.260 1203.260 44.280 2190.244 3.500 × 10^5