Muons in lithium iodide (LiI)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.41939 3.494 485.1 0.23274 2.7146 0.0892 3.3702 6.2671 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.564 4.565 1.240 × 10^0 14.0 MeV 5.616 × 10^1 3.603 3.603 2.236 × 10^0 20.0 MeV 6.802 × 10^1 2.845 2.845 4.130 × 10^0 30.0 MeV 8.509 × 10^1 2.233 2.233 8.150 × 10^0 40.0 MeV 1.003 × 10^2 1.921 1.921 1.301 × 10^1 80.0 MeV 1.527 × 10^2 1.469 1.469 3.755 × 10^1 100. MeV 1.764 × 10^2 1.389 1.389 5.158 × 10^1 140. MeV 2.218 × 10^2 1.313 1.313 8.134 × 10^1 200. MeV 2.868 × 10^2 1.277 1.277 1.278 × 10^2 243. MeV 3.325 × 10^2 1.272 1.273 Minimum ionization 300. MeV 3.917 × 10^2 1.277 0.000 0.000 1.278 2.063 × 10^2 400. MeV 4.945 × 10^2 1.297 0.000 0.000 1.298 2.840 × 10^2 800. MeV 8.995 × 10^2 1.385 0.001 0.000 1.386 5.818 × 10^2 1.00 GeV 1.101 × 10^3 1.420 0.001 0.000 1.422 7.242 × 10^2 1.40 GeV 1.502 × 10^3 1.476 0.002 0.000 0.001 1.478 9.999 × 10^2 2.00 GeV 2.103 × 10^3 1.536 0.003 0.001 0.001 1.540 1.397 × 10^3 3.00 GeV 3.104 × 10^3 1.603 0.005 0.003 0.001 1.612 2.031 × 10^3 4.00 GeV 4.104 × 10^3 1.650 0.007 0.005 0.002 1.664 2.641 × 10^3 8.00 GeV 8.105 × 10^3 1.755 0.017 0.016 0.003 1.793 4.947 × 10^3 10.0 GeV 1.011 × 10^4 1.787 0.023 0.023 0.004 1.837 6.049 × 10^3 14.0 GeV 1.411 × 10^4 1.832 0.034 0.037 0.006 1.910 8.183 × 10^3 20.0 GeV 2.011 × 10^4 1.877 0.053 0.061 0.008 2.000 1.125 × 10^4 30.0 GeV 3.011 × 10^4 1.925 0.087 0.106 0.011 2.130 1.609 × 10^4 40.0 GeV 4.011 × 10^4 1.956 0.123 0.156 0.015 2.251 2.066 × 10^4 80.0 GeV 8.011 × 10^4 2.025 0.279 0.374 0.029 2.708 3.682 × 10^4 100. GeV 1.001 × 10^5 2.046 0.361 0.491 0.036 2.936 4.392 × 10^4 140. GeV 1.401 × 10^5 2.076 0.530 0.734 0.051 3.392 5.658 × 10^4 200. GeV 2.001 × 10^5 2.107 0.795 1.117 0.072 4.092 7.267 × 10^4 212. GeV 2.117 × 10^5 2.112 0.846 1.189 0.076 4.225 Muon critical energy 300. GeV 3.001 × 10^5 2.142 1.247 1.758 0.108 5.256 9.419 × 10^4 400. GeV 4.001 × 10^5 2.167 1.714 2.422 0.144 6.447 1.113 × 10^5 800. GeV 8.001 × 10^5 2.227 3.644 5.144 0.291 11.307 1.576 × 10^5 1.00 TeV 1.000 × 10^6 2.246 4.635 6.537 0.366 13.785 1.736 × 10^5 1.40 TeV 1.400 × 10^6 2.276 6.623 9.316 0.518 18.734 1.984 × 10^5 2.00 TeV 2.000 × 10^6 2.308 9.663 13.557 0.749 26.278 2.253 × 10^5 3.00 TeV 3.000 × 10^6 2.344 14.739 20.604 1.145 38.834 2.565 × 10^5 4.00 TeV 4.000 × 10^6 2.371 19.882 27.727 1.548 51.529 2.787 × 10^5 8.00 TeV 8.000 × 10^6 2.436 40.622 56.359 3.217 102.635 3.327 × 10^5 10.0 TeV 1.000 × 10^7 2.457 51.074 70.752 4.074 128.358 3.501 × 10^5 14.0 TeV 1.400 × 10^7 2.490 71.920 99.470 5.835 179.716 3.763 × 10^5 20.0 TeV 2.000 × 10^7 2.525 103.376 142.731 8.533 257.166 4.041 × 10^5 30.0 TeV 3.000 × 10^7 2.566 155.742 214.709 13.196 386.214 4.356 × 10^5 40.0 TeV 4.000 × 10^7 2.595 208.297 286.857 17.970 515.721 4.579 × 10^5 80.0 TeV 8.000 × 10^7 2.667 418.837 575.651 37.904 1035.060 5.116 × 10^5 100. TeV 1.000 × 10^8 2.691 524.285 720.179 48.201 1295.357 5.288 × 10^5