Muons in polyoxymethylene [(CH_2O)_n]

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53287 1.425 77.4 0.10808 3.4002 0.1584 2.6838 3.2514 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.615 7.615 7.260 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.941 5.941 1.327 × 10^0 20.0 MeV 6.802 × 10^1 4.640 4.640 2.483 × 10^0 30.0 MeV 8.509 × 10^1 3.600 3.600 4.964 × 10^0 40.0 MeV 1.003 × 10^2 3.075 3.075 7.989 × 10^0 80.0 MeV 1.527 × 10^2 2.309 2.309 2.348 × 10^1 100. MeV 1.764 × 10^2 2.163 2.163 3.245 × 10^1 140. MeV 2.218 × 10^2 2.013 2.013 5.172 × 10^1 200. MeV 2.868 × 10^2 1.927 1.927 8.229 × 10^1 300. MeV 3.917 × 10^2 1.894 0.000 1.894 1.348 × 10^2 318. MeV 4.105 × 10^2 1.894 0.000 1.894 Minimum ionization 400. MeV 4.945 × 10^2 1.900 0.000 1.900 1.875 × 10^2 800. MeV 8.995 × 10^2 1.971 0.000 0.000 1.972 3.943 × 10^2 1.00 GeV 1.101 × 10^3 2.004 0.000 0.000 2.005 4.948 × 10^2 1.40 GeV 1.502 × 10^3 2.057 0.000 0.001 2.058 6.916 × 10^2 2.00 GeV 2.103 × 10^3 2.116 0.001 0.000 0.001 2.118 9.788 × 10^2 3.00 GeV 3.104 × 10^3 2.183 0.001 0.001 0.001 2.186 1.443 × 10^3 4.00 GeV 4.104 × 10^3 2.229 0.001 0.001 0.002 2.234 1.895 × 10^3 8.00 GeV 8.105 × 10^3 2.336 0.003 0.003 0.004 2.346 3.637 × 10^3 10.0 GeV 1.011 × 10^4 2.368 0.004 0.004 0.005 2.382 4.483 × 10^3 14.0 GeV 1.411 × 10^4 2.415 0.007 0.007 0.007 2.436 6.143 × 10^3 20.0 GeV 2.011 × 10^4 2.463 0.011 0.012 0.009 2.495 8.575 × 10^3 30.0 GeV 3.011 × 10^4 2.514 0.017 0.021 0.013 2.566 1.252 × 10^4 40.0 GeV 4.011 × 10^4 2.549 0.025 0.031 0.018 2.623 1.638 × 10^4 80.0 GeV 8.011 × 10^4 2.629 0.056 0.076 0.034 2.796 3.112 × 10^4 100. GeV 1.001 × 10^5 2.654 0.073 0.100 0.042 2.870 3.818 × 10^4 140. GeV 1.401 × 10^5 2.692 0.108 0.150 0.059 3.009 5.179 × 10^4 200. GeV 2.001 × 10^5 2.731 0.163 0.230 0.084 3.207 7.110 × 10^4 300. GeV 3.001 × 10^5 2.775 0.257 0.365 0.125 3.523 1.008 × 10^5 400. GeV 4.001 × 10^5 2.806 0.354 0.507 0.167 3.834 1.280 × 10^5 800. GeV 8.001 × 10^5 2.883 0.761 1.095 0.337 5.076 2.184 × 10^5 1.00 TeV 1.000 × 10^6 2.907 0.971 1.399 0.424 5.701 2.556 × 10^5 1.04 TeV 1.040 × 10^6 2.912 1.012 1.458 0.441 5.824 Muon critical energy 1.40 TeV 1.400 × 10^6 2.945 1.394 2.004 0.601 6.944 3.190 × 10^5 2.00 TeV 2.000 × 10^6 2.986 2.044 2.931 0.870 8.831 3.955 × 10^5 3.00 TeV 3.000 × 10^6 3.032 3.133 4.475 1.334 11.974 4.924 × 10^5 4.00 TeV 4.000 × 10^6 3.066 4.242 6.040 1.805 15.153 5.665 × 10^5 8.00 TeV 8.000 × 10^6 3.149 8.731 12.346 3.767 27.993 7.578 × 10^5 10.0 TeV 1.000 × 10^7 3.176 11.002 15.522 4.778 34.478 8.220 × 10^5 14.0 TeV 1.400 × 10^7 3.217 15.533 21.850 6.861 47.461 9.205 × 10^5 20.0 TeV 2.000 × 10^7 3.262 22.387 31.395 10.061 67.105 1.026 × 10^6 30.0 TeV 3.000 × 10^7 3.314 33.800 47.276 15.616 100.006 1.148 × 10^6 40.0 TeV 4.000 × 10^7 3.351 45.274 63.209 21.318 133.151 1.234 × 10^6 80.0 TeV 8.000 × 10^7 3.443 91.282 126.994 45.246 266.965 1.442 × 10^6 100. TeV 1.000 × 10^8 3.473 114.348 158.924 57.650 334.395 1.509 × 10^6