Muons in rhodium (Rh)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 45 (Rh) 102.90550 (2) 12.410 449.0 0.19205 2.8633 0.0576 3.1069 4.8008 0.14

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.778 4.778 1.190 × 10^0 14.0 MeV 5.616 × 10^1 3.775 3.775 2.141 × 10^0 20.0 MeV 6.802 × 10^1 2.982 2.982 3.949 × 10^0 30.0 MeV 8.509 × 10^1 2.338 2.338 7.787 × 10^0 40.0 MeV 1.003 × 10^2 2.008 2.008 1.243 × 10^1 80.0 MeV 1.527 × 10^2 1.527 1.527 3.598 × 10^1 100. MeV 1.764 × 10^2 1.442 1.442 4.949 × 10^1 140. MeV 2.218 × 10^2 1.358 1.358 7.820 × 10^1 200. MeV 2.868 × 10^2 1.317 1.317 1.232 × 10^2 252. MeV 3.421 × 10^2 1.310 1.310 Minimum ionization 300. MeV 3.917 × 10^2 1.313 0.000 0.000 1.313 1.995 × 10^2 400. MeV 4.945 × 10^2 1.330 0.000 0.000 1.331 2.751 × 10^2 800. MeV 8.995 × 10^2 1.412 0.001 0.000 1.413 5.665 × 10^2 1.00 GeV 1.101 × 10^3 1.445 0.001 0.000 1.447 7.063 × 10^2 1.40 GeV 1.502 × 10^3 1.498 0.002 0.000 0.001 1.501 9.775 × 10^2 2.00 GeV 2.103 × 10^3 1.555 0.003 0.001 0.001 1.560 1.369 × 10^3 3.00 GeV 3.104 × 10^3 1.620 0.004 0.003 0.001 1.629 1.996 × 10^3 4.00 GeV 4.104 × 10^3 1.664 0.007 0.005 0.002 1.678 2.600 × 10^3 8.00 GeV 8.105 × 10^3 1.765 0.016 0.016 0.003 1.801 4.892 × 10^3 10.0 GeV 1.011 × 10^4 1.795 0.021 0.022 0.004 1.843 5.989 × 10^3 14.0 GeV 1.411 × 10^4 1.839 0.033 0.036 0.005 1.913 8.118 × 10^3 20.0 GeV 2.011 × 10^4 1.882 0.051 0.059 0.008 1.999 1.118 × 10^4 30.0 GeV 3.011 × 10^4 1.927 0.083 0.102 0.011 2.124 1.603 × 10^4 40.0 GeV 4.011 × 10^4 1.958 0.117 0.149 0.015 2.239 2.062 × 10^4 80.0 GeV 8.011 × 10^4 2.025 0.264 0.357 0.030 2.677 3.692 × 10^4 100. GeV 1.001 × 10^5 2.046 0.342 0.469 0.037 2.896 4.410 × 10^4 140. GeV 1.401 × 10^5 2.077 0.503 0.701 0.051 3.332 5.697 × 10^4 200. GeV 2.001 × 10^5 2.109 0.754 1.067 0.072 4.003 7.338 × 10^4 221. GeV 2.214 × 10^5 2.118 0.843 1.195 0.080 4.237 Muon critical energy 300. GeV 3.001 × 10^5 2.145 1.182 1.679 0.109 5.116 9.544 × 10^4 400. GeV 4.001 × 10^5 2.171 1.625 2.313 0.145 6.255 1.131 × 10^5 800. GeV 8.001 × 10^5 2.234 3.456 4.915 0.293 10.898 1.610 × 10^5 1.00 TeV 1.000 × 10^6 2.254 4.396 6.246 0.368 13.265 1.776 × 10^5 1.40 TeV 1.400 × 10^6 2.285 6.282 8.902 0.521 17.992 2.034 × 10^5 2.00 TeV 2.000 × 10^6 2.318 9.168 12.956 0.754 25.198 2.314 × 10^5 3.00 TeV 3.000 × 10^6 2.356 13.986 19.693 1.153 37.191 2.639 × 10^5 4.00 TeV 4.000 × 10^6 2.384 18.871 26.503 1.559 49.318 2.872 × 10^5 8.00 TeV 8.000 × 10^6 2.452 38.567 53.879 3.240 98.139 3.436 × 10^5 10.0 TeV 1.000 × 10^7 2.474 48.494 67.641 4.103 122.713 3.618 × 10^5 14.0 TeV 1.400 × 10^7 2.508 68.295 95.100 5.875 171.780 3.892 × 10^5 20.0 TeV 2.000 × 10^7 2.545 98.176 136.466 8.592 245.780 4.182 × 10^5 30.0 TeV 3.000 × 10^7 2.587 147.920 205.292 13.288 369.088 4.512 × 10^5 40.0 TeV 4.000 × 10^7 2.618 197.847 274.285 18.095 492.845 4.746 × 10^5 80.0 TeV 8.000 × 10^7 2.693 397.871 550.454 38.165 989.185 5.307 × 10^5 100. TeV 1.000 × 10^8 2.718 498.060 688.670 48.530 1237.979 5.488 × 10^5