Muons in silver chloride (AgCl)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.44655 5.560 398.4 0.22968 2.7041 −0.0139 3.2022 5.3437 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 5.023 5.023 1.123 × 10^0 14.0 MeV 5.616 × 10^1 3.959 3.959 2.029 × 10^0 20.0 MeV 6.802 × 10^1 3.122 3.122 3.754 × 10^0 30.0 MeV 8.509 × 10^1 2.446 2.446 7.422 × 10^0 40.0 MeV 1.003 × 10^2 2.102 2.103 1.186 × 10^1 80.0 MeV 1.527 × 10^2 1.598 1.598 3.434 × 10^1 100. MeV 1.764 × 10^2 1.507 1.508 4.726 × 10^1 140. MeV 2.218 × 10^2 1.419 1.419 7.474 × 10^1 200. MeV 2.868 × 10^2 1.375 1.375 1.178 × 10^2 256. MeV 3.462 × 10^2 1.367 0.000 1.367 Minimum ionization 300. MeV 3.917 × 10^2 1.370 0.000 0.000 1.370 1.909 × 10^2 400. MeV 4.945 × 10^2 1.388 0.000 0.000 1.388 2.634 × 10^2 800. MeV 8.995 × 10^2 1.473 0.001 0.000 1.474 5.427 × 10^2 1.00 GeV 1.101 × 10^3 1.508 0.001 0.000 1.510 6.767 × 10^2 1.40 GeV 1.502 × 10^3 1.564 0.001 0.000 0.001 1.566 9.367 × 10^2 2.00 GeV 2.103 × 10^3 1.624 0.002 0.001 0.001 1.628 1.312 × 10^3 3.00 GeV 3.104 × 10^3 1.692 0.004 0.003 0.001 1.700 1.912 × 10^3 4.00 GeV 4.104 × 10^3 1.739 0.006 0.005 0.002 1.752 2.491 × 10^3 8.00 GeV 8.105 × 10^3 1.846 0.014 0.014 0.003 1.879 4.687 × 10^3 10.0 GeV 1.011 × 10^4 1.878 0.019 0.020 0.004 1.922 5.739 × 10^3 14.0 GeV 1.411 × 10^4 1.924 0.029 0.032 0.006 1.992 7.783 × 10^3 20.0 GeV 2.011 × 10^4 1.970 0.045 0.052 0.008 2.076 1.073 × 10^4 30.0 GeV 3.011 × 10^4 2.018 0.074 0.091 0.012 2.195 1.541 × 10^4 40.0 GeV 4.011 × 10^4 2.050 0.104 0.133 0.015 2.304 1.986 × 10^4 80.0 GeV 8.011 × 10^4 2.121 0.236 0.319 0.030 2.707 3.585 × 10^4 100. GeV 1.001 × 10^5 2.143 0.306 0.419 0.037 2.905 4.298 × 10^4 140. GeV 1.401 × 10^5 2.174 0.449 0.625 0.052 3.301 5.589 × 10^4 200. GeV 2.001 × 10^5 2.207 0.673 0.952 0.074 3.906 7.258 × 10^4 255. GeV 2.556 × 10^5 2.230 0.883 1.252 0.094 4.460 Muon critical energy 300. GeV 3.001 × 10^5 2.244 1.056 1.499 0.111 4.910 9.537 × 10^4 400. GeV 4.001 × 10^5 2.271 1.452 2.066 0.147 5.936 1.139 × 10^5 800. GeV 8.001 × 10^5 2.334 3.087 4.391 0.298 10.112 1.649 × 10^5 1.00 TeV 1.000 × 10^6 2.355 3.928 5.582 0.375 12.241 1.829 × 10^5 1.40 TeV 1.400 × 10^6 2.387 5.614 7.957 0.531 16.490 2.109 × 10^5 2.00 TeV 2.000 × 10^6 2.421 8.195 11.583 0.768 22.968 2.416 × 10^5 3.00 TeV 3.000 × 10^6 2.460 12.504 17.610 1.174 33.749 2.774 × 10^5 4.00 TeV 4.000 × 10^6 2.488 16.872 23.701 1.587 44.650 3.030 × 10^5 8.00 TeV 8.000 × 10^6 2.557 34.491 48.194 3.300 88.544 3.654 × 10^5 10.0 TeV 1.000 × 10^7 2.580 43.373 60.508 4.180 110.642 3.856 × 10^5 14.0 TeV 1.400 × 10^7 2.615 61.091 85.073 5.988 154.768 4.160 × 10^5 20.0 TeV 2.000 × 10^7 2.652 87.831 122.082 8.759 221.325 4.483 × 10^5 30.0 TeV 3.000 × 10^7 2.696 132.339 183.665 13.551 332.252 4.849 × 10^5 40.0 TeV 4.000 × 10^7 2.727 177.014 245.400 18.458 443.600 5.109 × 10^5 80.0 TeV 8.000 × 10^7 2.804 356.006 492.508 38.961 890.280 5.733 × 10^5 100. TeV 1.000 × 10^8 2.829 445.665 616.178 49.554 1114.227 5.933 × 10^5