6/1/2026 17:23 Page 1

NODE=M111

π_1(1400)^{I G (JPC ) = 1−(1 − +)}

OMITTED FROM SUMMARY TABLE Coupled channel analyses favor the existence of only one broad 1 − + NODE=M111 isovector state consistent with π1(1600) in the 1400–1600 MeV region. See the review on ”Spectroscopy of Light Meson Resonances”. See also π1(1600).