CROATIA UT=[�1]

ffl Entrance code = 385. Exit code = 99. Area exit code = 0.

“Rudjer Bošković” Inst.; Theor. Physics;

PO Box 1016 Bijenička 54; HR-10001 Zagreb (Phone #1 is Switchboard; #2 is Theory) Fax: (1)-425–497 (General) Fax: (1)-428–541 (Theory) Node: thphys.irb.hr

(1)-45 61 111 (1)-45 61 035

Zagreb Univ.; Theoretical Physics Dept.;

PO Box 162 Bijenička c. 32; HR-10 004 Zagreb (Phone #1 is Switchboard; #2 is Theory Secretary; #3 is Theory Secretary) Fax: (1)-432–525 Node: phy.hr

(1)-45 55 730 (1)-45 55 726 (1)-432–527

CUBA UT=[+5]

ffl Entrance code = 53.

Centro de Matematica y Fisica Teorica

Grupo de Fisica Teorica; Calle E 309, Vedado; 4 Havana Fax: (7)-333 373 Telex: 512230 ICIMAF CU Node: cidet.icmf.edu.cu

(7)-324 567 (7)-324 568

CZECH REPUBLIC UT=[�1]

ffl Entrance code = 42. Exit code = 00.

Charles Univ.; Nuclear Center;

V Holešovičkách 2; CZ-18000 Prague 8 (Phone #1 is Switchboard; #2 is Secretary) Fax: (2)-8576 2434 Nodes: hp01.troja.mff.cuni.cz; hp03.troja.mff.cuni.cz

(2)-8576 1111 (2)-8576 2437

Inst. of Physics, ASCR

Division of Elementary Particle Physics; Na Slovance 2; CZ-18040 Prague 8 (Phone #1 is Switchboard; #2 is HEP) Fax: (2)-858 4569 Fax: (2)-82 1227 Telex: 122 018 atom c Node: fzu.cz

(2)-815 1111 (2)-858 5443

Nuclear Physics Inst. AVČR

CZ-250 68 Řež (Phone #1 is Switchboard; #2 is Secretary to Director) Fax: (2)-685 7003 Telex: 122 626 ujvc Node: ujf.cas.cz

(2)-6617 1111 (2)-688 5261

DENMARK UT=[�1]

ffl Entrance code = 45. Exit code = 009. Area exit code = 0.

Univ. of Aarhus; ISA - Inst. for Storage Ring Facilities;

Inst. of Physics & Astronomy; Ny Munkegade, Bygn 520; DK-8000 Aarhus C (Phone #1 is Switchboard; #2 is Secretary) Fax: (86)-12 07 40 Node: dfi.aau.dk

(45)-8942 2899 (45)-8612 0740

Niels Bohr Inst.; Theor. High Energy Physics Dept.;

Blegdamsvej 17; DK-2100 Copenhagen Ø Fax: (31)-42 10 16 Telex: 15216 nbi dk Node: nbivax.nbi.dk

(35)-32 52 00

Nordita; Nordisk Inst. for Teoretisk Fysik;

Blegdamsvej 17; DK-2100 Copenhagen Ø Fax: (31)-38 91 57 Node: nordita.dk

(35)-32 55 00