0 0.5 1 1.5

0 0.2 0.4 0.6 0 0.25 0.5 0.75 1

0 0.2 0.4 0.6

0

0.25

0.5

0.75

1

1.25

1.5

1.75

2

1 10 10^2

x x F_3 ^{γ Z}

Q^2=1500 GeV^2 Q^2=5000 GeV^2 Q^2=12000 GeV^2

x x F_3 ^{γ Z}

Q^2=40-180 GeV^2

Q^2 (GeV^2) xF_3(x,Q^2) + c(x)

Q^2 (GeV^2)

CCFR

0

0.25

0.5

0.75

1

1.25

1.5

1.75

2

1 10 10^2