b(E) × 10^6 [cm^2g^{−1}] for dimethyl sulfoxide (CH_3)_2SO

⟨Z/A⟩ = 0.53757

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3851 0.1751 0.4588 1.0191 5. 0.5232 0.4308 0.4865 1.4404 10. 0.6363 0.6424 0.4727 1.7514 20. 0.7545 0.8690 0.4515 2.0750 50. 0.9134 1.1901 0.4281 2.5317 100. 1.0305 1.4145 0.4168 2.8618 200. 1.1406 1.6147 0.4110 3.1663 500. 1.2700 1.8280 0.4102 3.5082 1000. 1.3520 1.9474 0.4167 3.7162 2000. 1.4193 2.0342 0.4278 3.8812 5000. 1.4855 2.1093 0.4484 4.0432 10000. 1.5203 2.1448 0.4692 4.1342 20000. 1.5450 2.1672 0.4936 4.2057 50000. 1.5653 2.1850 0.5318 4.2821 100000. 1.5749 2.1923 0.5646 4.3318