Muons in adipose tissue (ICRP)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55947 0.920 63.2 0.10278 3.4817 0.1827 2.6530 3.2367 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.205 8.205 6.725 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.395 6.396 1.231 × 10^0 20.0 MeV 6.802 × 10^1 4.991 4.991 2.305 × 10^0 30.0 MeV 8.509 × 10^1 3.869 3.869 4.613 × 10^0 40.0 MeV 1.003 × 10^2 3.302 3.302 7.429 × 10^0 80.0 MeV 1.527 × 10^2 2.476 2.476 2.187 × 10^1 100. MeV 1.764 × 10^2 2.322 2.322 3.023 × 10^1 140. MeV 2.218 × 10^2 2.160 2.160 4.817 × 10^1 200. MeV 2.868 × 10^2 2.067 2.067 7.668 × 10^1 300. MeV 3.917 × 10^2 2.030 0.000 2.030 1.256 × 10^2 324. MeV 4.161 × 10^2 2.029 0.000 2.029 Minimum ionization 400. MeV 4.945 × 10^2 2.035 0.000 2.035 1.749 × 10^2 800. MeV 8.995 × 10^2 2.108 0.000 0.000 2.108 3.681 × 10^2 1.00 GeV 1.101 × 10^3 2.142 0.000 0.000 2.142 4.622 × 10^2 1.40 GeV 1.502 × 10^3 2.197 0.000 0.001 2.198 6.464 × 10^2 2.00 GeV 2.103 × 10^3 2.258 0.000 0.000 0.001 2.260 9.154 × 10^2 3.00 GeV 3.104 × 10^3 2.327 0.001 0.001 0.001 2.330 1.351 × 10^3 4.00 GeV 4.104 × 10^3 2.376 0.001 0.001 0.002 2.380 1.775 × 10^3 8.00 GeV 8.105 × 10^3 2.487 0.003 0.003 0.004 2.497 3.411 × 10^3 10.0 GeV 1.011 × 10^4 2.520 0.004 0.004 0.005 2.534 4.206 × 10^3 14.0 GeV 1.411 × 10^4 2.570 0.006 0.007 0.007 2.589 5.767 × 10^3 20.0 GeV 2.011 × 10^4 2.619 0.010 0.011 0.009 2.649 8.056 × 10^3 30.0 GeV 3.011 × 10^4 2.673 0.016 0.019 0.014 2.722 1.178 × 10^4 40.0 GeV 4.011 × 10^4 2.710 0.022 0.028 0.018 2.779 1.541 × 10^4 80.0 GeV 8.011 × 10^4 2.794 0.051 0.069 0.035 2.949 2.936 × 10^4 100. GeV 1.001 × 10^5 2.820 0.067 0.091 0.043 3.021 3.606 × 10^4 140. GeV 1.401 × 10^5 2.860 0.098 0.137 0.060 3.154 4.902 × 10^4 200. GeV 2.001 × 10^5 2.901 0.148 0.209 0.084 3.343 6.749 × 10^4 300. GeV 3.001 × 10^5 2.947 0.234 0.333 0.126 3.641 9.614 × 10^4 400. GeV 4.001 × 10^5 2.980 0.323 0.462 0.169 3.934 1.226 × 10^5 800. GeV 8.001 × 10^5 3.060 0.696 1.000 0.341 5.096 2.116 × 10^5 1.00 TeV 1.000 × 10^6 3.086 0.888 1.279 0.428 5.681 2.488 × 10^5 1.18 TeV 1.184 × 10^6 3.106 1.065 1.531 0.510 6.212 Muon critical energy 1.40 TeV 1.400 × 10^6 3.126 1.276 1.833 0.607 6.842 3.129 × 10^5 2.00 TeV 2.000 × 10^6 3.168 1.873 2.683 0.879 8.603 3.909 × 10^5 3.00 TeV 3.000 × 10^6 3.217 2.873 4.098 1.347 11.536 4.910 × 10^5 4.00 TeV 4.000 × 10^6 3.253 3.892 5.534 1.823 14.502 5.681 × 10^5 8.00 TeV 8.000 × 10^6 3.339 8.021 11.319 3.806 26.486 7.693 × 10^5 10.0 TeV 1.000 × 10^7 3.368 10.110 14.234 4.828 32.540 8.373 × 10^5 14.0 TeV 1.400 × 10^7 3.411 14.280 20.040 6.934 44.667 9.418 × 10^5 20.0 TeV 2.000 × 10^7 3.458 20.591 28.800 10.172 63.021 1.054 × 10^6 30.0 TeV 3.000 × 10^7 3.513 31.101 43.372 15.793 93.779 1.184 × 10^6 40.0 TeV 4.000 × 10^7 3.552 41.671 57.993 21.564 124.780 1.276 × 10^6 80.0 TeV 8.000 × 10^7 3.648 84.052 116.528 45.798 250.026 1.498 × 10^6 100. TeV 1.000 × 10^8 3.680 105.300 145.830 58.365 313.175 1.569 × 10^6