Muons in cellulose [(C_6H_{10}O_5)_n]

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.53040 1.420 77.6 0.11151 3.3810 0.1580 2.6778 3.2647 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.577 7.577 7.296 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.911 5.911 1.334 × 10^0 20.0 MeV 6.802 × 10^1 4.617 4.617 2.495 × 10^0 30.0 MeV 8.509 × 10^1 3.583 3.583 4.988 × 10^0 40.0 MeV 1.003 × 10^2 3.060 3.060 8.028 × 10^0 80.0 MeV 1.527 × 10^2 2.297 2.297 2.360 × 10^1 100. MeV 1.764 × 10^2 2.152 2.152 3.261 × 10^1 140. MeV 2.218 × 10^2 2.003 2.004 5.197 × 10^1 200. MeV 2.868 × 10^2 1.918 1.918 8.270 × 10^1 300. MeV 3.917 × 10^2 1.885 0.000 1.885 1.354 × 10^2 318. MeV 4.105 × 10^2 1.885 0.000 1.885 Minimum ionization 400. MeV 4.945 × 10^2 1.891 0.000 1.891 1.884 × 10^2 800. MeV 8.995 × 10^2 1.962 0.000 0.000 1.963 3.961 × 10^2 1.00 GeV 1.101 × 10^3 1.995 0.000 0.000 1.996 4.972 × 10^2 1.40 GeV 1.502 × 10^3 2.048 0.000 0.001 2.049 6.949 × 10^2 2.00 GeV 2.103 × 10^3 2.106 0.001 0.000 0.001 2.108 9.833 × 10^2 3.00 GeV 3.104 × 10^3 2.173 0.001 0.001 0.001 2.176 1.450 × 10^3 4.00 GeV 4.104 × 10^3 2.219 0.001 0.001 0.002 2.224 1.904 × 10^3 8.00 GeV 8.105 × 10^3 2.326 0.003 0.003 0.004 2.336 3.654 × 10^3 10.0 GeV 1.011 × 10^4 2.358 0.004 0.004 0.005 2.372 4.503 × 10^3 14.0 GeV 1.411 × 10^4 2.405 0.007 0.007 0.007 2.425 6.170 × 10^3 20.0 GeV 2.011 × 10^4 2.452 0.011 0.012 0.009 2.484 8.613 × 10^3 30.0 GeV 3.011 × 10^4 2.503 0.017 0.021 0.013 2.555 1.258 × 10^4 40.0 GeV 4.011 × 10^4 2.538 0.025 0.031 0.018 2.611 1.645 × 10^4 80.0 GeV 8.011 × 10^4 2.618 0.056 0.075 0.034 2.783 3.126 × 10^4 100. GeV 1.001 × 10^5 2.643 0.073 0.099 0.042 2.857 3.835 × 10^4 140. GeV 1.401 × 10^5 2.680 0.107 0.149 0.059 2.995 5.202 × 10^4 200. GeV 2.001 × 10^5 2.719 0.161 0.228 0.084 3.192 7.142 × 10^4 300. GeV 3.001 × 10^5 2.763 0.255 0.363 0.125 3.505 1.013 × 10^5 400. GeV 4.001 × 10^5 2.794 0.351 0.503 0.167 3.815 1.286 × 10^5 800. GeV 8.001 × 10^5 2.870 0.755 1.086 0.337 5.048 2.195 × 10^5 1.00 TeV 1.000 × 10^6 2.895 0.963 1.388 0.424 5.670 2.568 × 10^5 1.04 TeV 1.042 × 10^6 2.899 1.007 1.450 0.442 5.799 Muon critical energy 1.40 TeV 1.400 × 10^6 2.932 1.383 1.988 0.601 6.905 3.207 × 10^5 2.00 TeV 2.000 × 10^6 2.972 2.028 2.909 0.870 8.780 3.976 × 10^5 3.00 TeV 3.000 × 10^6 3.019 3.109 4.441 1.334 11.903 4.950 × 10^5 4.00 TeV 4.000 × 10^6 3.052 4.209 5.994 1.805 15.061 5.696 × 10^5 8.00 TeV 8.000 × 10^6 3.135 8.664 12.253 3.768 27.819 7.620 × 10^5 10.0 TeV 1.000 × 10^7 3.162 10.917 15.405 4.779 34.262 8.267 × 10^5 14.0 TeV 1.400 × 10^7 3.203 15.413 21.685 6.862 47.163 9.258 × 10^5 20.0 TeV 2.000 × 10^7 3.248 22.214 31.158 10.062 66.682 1.032 × 10^6 30.0 TeV 3.000 × 10^7 3.299 33.539 46.920 15.618 99.376 1.154 × 10^6 40.0 TeV 4.000 × 10^7 3.336 44.924 62.734 21.320 132.314 1.241 × 10^6 80.0 TeV 8.000 × 10^7 3.428 90.574 126.040 45.251 265.293 1.451 × 10^6 100. TeV 1.000 × 10^8 3.458 113.459 157.731 57.657 332.305 1.518 × 10^6