Muons in cyclohexane (C_6H_{12})

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.57034 0.779 56.4 0.12035 3.4278 0.1728 2.5549 3.1544 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.485 8.485 6.497 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.610 6.610 1.189 × 10^0 20.0 MeV 6.802 × 10^1 5.156 5.156 2.229 × 10^0 30.0 MeV 8.509 × 10^1 3.995 3.995 4.464 × 10^0 40.0 MeV 1.003 × 10^2 3.408 3.408 7.192 × 10^0 80.0 MeV 1.527 × 10^2 2.553 2.553 2.119 × 10^1 100. MeV 1.764 × 10^2 2.392 2.392 2.930 × 10^1 140. MeV 2.218 × 10^2 2.225 2.225 4.672 × 10^1 200. MeV 2.868 × 10^2 2.128 2.128 7.440 × 10^1 300. MeV 3.917 × 10^2 2.089 0.000 2.089 1.220 × 10^2 328. MeV 4.211 × 10^2 2.087 0.000 2.088 Minimum ionization 400. MeV 4.945 × 10^2 2.093 0.000 2.093 1.698 × 10^2 800. MeV 8.995 × 10^2 2.166 0.000 0.000 2.166 3.578 × 10^2 1.00 GeV 1.101 × 10^3 2.200 0.000 0.000 2.201 4.494 × 10^2 1.40 GeV 1.502 × 10^3 2.256 0.000 0.001 2.257 6.288 × 10^2 2.00 GeV 2.103 × 10^3 2.317 0.000 0.000 0.001 2.319 8.908 × 10^2 3.00 GeV 3.104 × 10^3 2.388 0.001 0.000 0.001 2.390 1.315 × 10^3 4.00 GeV 4.104 × 10^3 2.436 0.001 0.001 0.002 2.440 1.729 × 10^3 8.00 GeV 8.105 × 10^3 2.549 0.003 0.003 0.004 2.558 3.325 × 10^3 10.0 GeV 1.011 × 10^4 2.583 0.004 0.004 0.005 2.595 4.101 × 10^3 14.0 GeV 1.411 × 10^4 2.633 0.006 0.006 0.007 2.651 5.625 × 10^3 20.0 GeV 2.011 × 10^4 2.683 0.009 0.010 0.009 2.711 7.861 × 10^3 30.0 GeV 3.011 × 10^4 2.738 0.015 0.018 0.014 2.784 1.150 × 10^4 40.0 GeV 4.011 × 10^4 2.775 0.021 0.026 0.018 2.840 1.505 × 10^4 80.0 GeV 8.011 × 10^4 2.861 0.047 0.063 0.035 3.007 2.872 × 10^4 100. GeV 1.001 × 10^5 2.888 0.061 0.084 0.043 3.076 3.529 × 10^4 140. GeV 1.401 × 10^5 2.928 0.091 0.126 0.060 3.204 4.803 × 10^4 200. GeV 2.001 × 10^5 2.970 0.137 0.193 0.085 3.385 6.624 × 10^4 300. GeV 3.001 × 10^5 3.017 0.216 0.307 0.127 3.668 9.461 × 10^4 400. GeV 4.001 × 10^5 3.051 0.299 0.427 0.170 3.946 1.209 × 10^5 800. GeV 8.001 × 10^5 3.132 0.644 0.925 0.343 5.044 2.103 × 10^5 1.00 TeV 1.000 × 10^6 3.159 0.822 1.183 0.430 5.595 2.479 × 10^5 1.29 TeV 1.287 × 10^6 3.189 1.079 1.550 0.559 6.378 Muon critical energy 1.40 TeV 1.400 × 10^6 3.199 1.182 1.697 0.611 6.689 3.132 × 10^5 2.00 TeV 2.000 × 10^6 3.243 1.736 2.485 0.884 8.348 3.934 × 10^5 3.00 TeV 3.000 × 10^6 3.293 2.665 3.799 1.355 11.112 4.969 × 10^5 4.00 TeV 4.000 × 10^6 3.329 3.612 5.132 1.834 13.907 5.772 × 10^5 8.00 TeV 8.000 × 10^6 3.417 7.450 10.502 3.831 25.201 7.878 × 10^5 10.0 TeV 1.000 × 10^7 3.446 9.393 13.208 4.860 30.908 8.594 × 10^5 14.0 TeV 1.400 × 10^7 3.490 13.272 18.599 6.982 42.344 9.695 × 10^5 20.0 TeV 2.000 × 10^7 3.538 19.144 26.732 10.243 59.658 1.088 × 10^6 30.0 TeV 3.000 × 10^7 3.594 28.924 40.262 15.907 88.687 1.225 × 10^6 40.0 TeV 4.000 × 10^7 3.633 38.762 53.838 21.722 117.955 1.322 × 10^6 80.0 TeV 8.000 × 10^7 3.732 78.203 108.188 46.153 236.276 1.557 × 10^6 100. TeV 1.000 × 10^8 3.764 97.977 135.397 58.825 295.964 1.633 × 10^6