Muons in lithium fluoride (LiF)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.46262 2.635 94.0 0.07593 3.7478 0.0171 2.7049 3.1667 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.444 6.444 8.595 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.032 5.032 1.569 × 10^0 20.0 MeV 6.802 × 10^1 3.934 3.934 2.933 × 10^0 30.0 MeV 8.509 × 10^1 3.056 3.056 5.858 × 10^0 40.0 MeV 1.003 × 10^2 2.611 2.611 9.421 × 10^0 80.0 MeV 1.527 × 10^2 1.955 1.955 2.768 × 10^1 100. MeV 1.764 × 10^2 1.834 1.834 3.827 × 10^1 140. MeV 2.218 × 10^2 1.710 1.710 6.097 × 10^1 200. MeV 2.868 × 10^2 1.640 1.640 9.693 × 10^1 300. MeV 3.917 × 10^2 1.614 0.000 1.614 1.586 × 10^2 314. MeV 4.065 × 10^2 1.614 0.000 1.614 Minimum ionization 400. MeV 4.945 × 10^2 1.620 0.000 1.620 2.204 × 10^2 800. MeV 8.995 × 10^2 1.683 0.000 0.000 1.683 4.627 × 10^2 1.00 GeV 1.101 × 10^3 1.711 0.000 0.000 1.712 5.805 × 10^2 1.40 GeV 1.502 × 10^3 1.757 0.000 0.001 1.758 8.109 × 10^2 2.00 GeV 2.103 × 10^3 1.807 0.001 0.000 0.001 1.809 1.147 × 10^3 3.00 GeV 3.104 × 10^3 1.864 0.001 0.001 0.001 1.867 1.691 × 10^3 4.00 GeV 4.104 × 10^3 1.904 0.001 0.001 0.002 1.908 2.220 × 10^3 8.00 GeV 8.105 × 10^3 1.995 0.003 0.003 0.004 2.006 4.258 × 10^3 10.0 GeV 1.011 × 10^4 2.023 0.004 0.004 0.005 2.037 5.248 × 10^3 14.0 GeV 1.411 × 10^4 2.063 0.007 0.007 0.007 2.084 7.188 × 10^3 20.0 GeV 2.011 × 10^4 2.104 0.011 0.012 0.009 2.137 1.003 × 10^4 30.0 GeV 3.011 × 10^4 2.149 0.017 0.021 0.013 2.201 1.464 × 10^4 40.0 GeV 4.011 × 10^4 2.179 0.025 0.031 0.017 2.253 1.913 × 10^4 80.0 GeV 8.011 × 10^4 2.249 0.056 0.076 0.034 2.415 3.625 × 10^4 100. GeV 1.001 × 10^5 2.271 0.073 0.100 0.042 2.485 4.441 × 10^4 140. GeV 1.401 × 10^5 2.303 0.107 0.150 0.058 2.619 6.008 × 10^4 200. GeV 2.001 × 10^5 2.337 0.161 0.229 0.083 2.811 8.219 × 10^4 300. GeV 3.001 × 10^5 2.376 0.254 0.364 0.124 3.118 1.160 × 10^5 400. GeV 4.001 × 10^5 2.403 0.351 0.504 0.165 3.423 1.466 × 10^5 800. GeV 8.001 × 10^5 2.469 0.753 1.087 0.334 4.643 2.465 × 10^5 904. GeV 9.039 × 10^5 2.481 0.860 1.243 0.378 4.962 Muon critical energy 1.00 TeV 1.000 × 10^6 2.491 0.960 1.388 0.419 5.259 2.870 × 10^5 1.40 TeV 1.400 × 10^6 2.523 1.378 1.987 0.595 6.484 3.554 × 10^5 2.00 TeV 2.000 × 10^6 2.558 2.019 2.905 0.862 8.345 4.367 × 10^5 3.00 TeV 3.000 × 10^6 2.599 3.093 4.434 1.320 11.446 5.387 × 10^5 4.00 TeV 4.000 × 10^6 2.628 4.186 5.983 1.786 14.584 6.159 × 10^5 8.00 TeV 8.000 × 10^6 2.700 8.607 12.223 3.728 27.257 8.134 × 10^5 10.0 TeV 1.000 × 10^7 2.724 10.841 15.365 4.728 33.658 8.793 × 10^5 14.0 TeV 1.400 × 10^7 2.760 15.300 21.626 6.787 46.473 9.800 × 10^5 20.0 TeV 2.000 × 10^7 2.798 22.041 31.070 9.950 65.860 1.088 × 10^6 30.0 TeV 3.000 × 10^7 2.843 33.266 46.783 15.440 98.332 1.211 × 10^6 40.0 TeV 4.000 × 10^7 2.876 44.547 62.546 21.073 131.042 1.299 × 10^6 80.0 TeV 8.000 × 10^7 2.955 89.782 125.654 44.706 263.098 1.510 × 10^6 100. TeV 1.000 × 10^8 2.982 112.459 157.246 56.954 329.641 1.578 × 10^6