Muons in mercuric iodide HgI_2

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.40933 6.360 684.5 0.21513 2.7264 0.1040 3.4728 6.3787 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.193 4.193 1.358 × 10^0 14.0 MeV 5.616 × 10^1 3.320 3.320 2.441 × 10^0 20.0 MeV 6.802 × 10^1 2.629 2.629 4.493 × 10^0 30.0 MeV 8.509 × 10^1 2.069 2.069 8.837 × 10^0 40.0 MeV 1.003 × 10^2 1.784 1.784 1.407 × 10^1 80.0 MeV 1.527 × 10^2 1.369 1.369 4.044 × 10^1 100. MeV 1.764 × 10^2 1.296 1.297 5.549 × 10^1 140. MeV 2.218 × 10^2 1.227 1.227 8.734 × 10^1 200. MeV 2.868 × 10^2 1.196 1.196 1.370 × 10^2 233. MeV 3.220 × 10^2 1.193 1.193 Minimum ionization 300. MeV 3.917 × 10^2 1.200 0.000 0.000 1.200 2.207 × 10^2 400. MeV 4.945 × 10^2 1.220 0.000 0.000 1.221 3.033 × 10^2 800. MeV 8.995 × 10^2 1.308 0.001 0.000 1.309 6.192 × 10^2 1.00 GeV 1.101 × 10^3 1.342 0.001 0.000 1.344 7.700 × 10^2 1.40 GeV 1.502 × 10^3 1.397 0.002 0.000 0.001 1.399 1.061 × 10^3 2.00 GeV 2.103 × 10^3 1.456 0.003 0.001 0.001 1.461 1.480 × 10^3 3.00 GeV 3.104 × 10^3 1.522 0.006 0.003 0.001 1.533 2.148 × 10^3 4.00 GeV 4.104 × 10^3 1.568 0.008 0.006 0.002 1.584 2.789 × 10^3 8.00 GeV 8.105 × 10^3 1.672 0.021 0.019 0.003 1.716 5.205 × 10^3 10.0 GeV 1.011 × 10^4 1.703 0.028 0.027 0.004 1.763 6.354 × 10^3 14.0 GeV 1.411 × 10^4 1.748 0.042 0.044 0.005 1.841 8.573 × 10^3 20.0 GeV 2.011 × 10^4 1.793 0.066 0.072 0.007 1.939 1.175 × 10^4 30.0 GeV 3.011 × 10^4 1.840 0.108 0.127 0.011 2.086 1.671 × 10^4 40.0 GeV 4.011 × 10^4 1.871 0.152 0.187 0.015 2.225 2.136 × 10^4 80.0 GeV 8.011 × 10^4 1.939 0.343 0.450 0.028 2.762 3.746 × 10^4 100. GeV 1.001 × 10^5 1.960 0.445 0.591 0.035 3.032 4.437 × 10^4 140. GeV 1.401 × 10^5 1.989 0.653 0.883 0.049 3.576 5.650 × 10^4 172. GeV 1.717 × 10^5 2.007 0.823 1.124 0.060 4.015 Muon critical energy 200. GeV 2.001 × 10^5 2.020 0.979 1.346 0.070 4.416 7.158 × 10^4 300. GeV 3.001 × 10^5 2.054 1.535 2.118 0.105 5.813 9.127 × 10^4 400. GeV 4.001 × 10^5 2.078 2.110 2.918 0.140 7.248 1.067 × 10^5 800. GeV 8.001 × 10^5 2.137 4.481 6.199 0.283 13.102 1.471 × 10^5 1.00 TeV 1.000 × 10^6 2.156 5.699 7.878 0.355 16.090 1.609 × 10^5 1.40 TeV 1.400 × 10^6 2.185 8.140 11.225 0.503 22.055 1.820 × 10^5 2.00 TeV 2.000 × 10^6 2.216 11.872 16.333 0.728 31.151 2.048 × 10^5 3.00 TeV 3.000 × 10^6 2.252 18.101 24.820 1.113 46.288 2.310 × 10^5 4.00 TeV 4.000 × 10^6 2.278 24.412 33.398 1.504 61.593 2.497 × 10^5 8.00 TeV 8.000 × 10^6 2.341 49.849 67.874 3.123 123.189 2.947 × 10^5 10.0 TeV 1.000 × 10^7 2.362 62.664 85.203 3.955 154.185 3.092 × 10^5 14.0 TeV 1.400 × 10^7 2.394 88.225 119.781 5.661 216.062 3.310 × 10^5 20.0 TeV 2.000 × 10^7 2.428 126.786 171.867 8.275 309.358 3.541 × 10^5 30.0 TeV 3.000 × 10^7 2.468 190.981 258.525 12.790 464.766 3.803 × 10^5 40.0 TeV 4.000 × 10^7 2.497 255.401 345.385 17.411 620.695 3.988 × 10^5 80.0 TeV 8.000 × 10^7 2.567 513.445 693.064 36.695 1245.772 4.434 × 10^5 100. TeV 1.000 × 10^8 2.590 642.675 867.060 46.652 1558.979 4.577 × 10^5