Muons in muscle-equivalent liquid without sucrose

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.55014 1.070 74.2 0.09143 3.4982 0.2187 2.7680 3.4216 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 7.905 7.905 6.991 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.166 6.166 1.278 × 10^0 20.0 MeV 6.802 × 10^1 4.815 4.815 2.392 × 10^0 30.0 MeV 8.509 × 10^1 3.735 3.735 4.783 × 10^0 40.0 MeV 1.003 × 10^2 3.189 3.189 7.699 × 10^0 80.0 MeV 1.527 × 10^2 2.394 2.394 2.264 × 10^1 100. MeV 1.764 × 10^2 2.251 2.252 3.127 × 10^1 140. MeV 2.218 × 10^2 2.096 2.097 4.977 × 10^1 200. MeV 2.868 × 10^2 2.007 2.007 7.913 × 10^1 300. MeV 3.917 × 10^2 1.973 0.000 1.973 1.295 × 10^2 318. MeV 4.105 × 10^2 1.973 0.000 1.973 Minimum ionization 400. MeV 4.945 × 10^2 1.979 0.000 1.979 1.802 × 10^2 800. MeV 8.995 × 10^2 2.054 0.000 0.000 2.054 3.786 × 10^2 1.00 GeV 1.101 × 10^3 2.088 0.000 0.000 2.088 4.751 × 10^2 1.40 GeV 1.502 × 10^3 2.143 0.000 0.001 2.144 6.641 × 10^2 2.00 GeV 2.103 × 10^3 2.204 0.001 0.000 0.001 2.206 9.397 × 10^2 3.00 GeV 3.104 × 10^3 2.273 0.001 0.001 0.001 2.277 1.386 × 10^3 4.00 GeV 4.104 × 10^3 2.322 0.001 0.001 0.002 2.326 1.820 × 10^3 8.00 GeV 8.105 × 10^3 2.432 0.004 0.003 0.004 2.443 3.493 × 10^3 10.0 GeV 1.011 × 10^4 2.466 0.005 0.005 0.005 2.480 4.305 × 10^3 14.0 GeV 1.411 × 10^4 2.515 0.007 0.008 0.007 2.536 5.899 × 10^3 20.0 GeV 2.011 × 10^4 2.564 0.011 0.013 0.009 2.597 8.235 × 10^3 30.0 GeV 3.011 × 10^4 2.617 0.018 0.022 0.013 2.671 1.203 × 10^4 40.0 GeV 4.011 × 10^4 2.653 0.026 0.033 0.018 2.729 1.573 × 10^4 80.0 GeV 8.011 × 10^4 2.736 0.059 0.079 0.034 2.908 2.990 × 10^4 100. GeV 1.001 × 10^5 2.762 0.076 0.104 0.042 2.985 3.669 × 10^4 140. GeV 1.401 × 10^5 2.800 0.113 0.157 0.059 3.129 4.978 × 10^4 200. GeV 2.001 × 10^5 2.841 0.170 0.240 0.084 3.334 6.835 × 10^4 300. GeV 3.001 × 10^5 2.886 0.268 0.381 0.125 3.661 9.695 × 10^4 400. GeV 4.001 × 10^5 2.919 0.369 0.528 0.167 3.984 1.231 × 10^5 800. GeV 8.001 × 10^5 2.998 0.793 1.141 0.337 5.269 2.102 × 10^5 1.00 TeV 1.000 × 10^6 3.023 1.012 1.458 0.424 5.917 2.460 × 10^5 1.04 TeV 1.044 × 10^6 3.028 1.059 1.526 0.443 6.056 Muon critical energy 1.40 TeV 1.400 × 10^6 3.062 1.453 2.088 0.601 7.204 3.071 × 10^5 2.00 TeV 2.000 × 10^6 3.104 2.131 3.054 0.870 9.159 3.808 × 10^5 3.00 TeV 3.000 × 10^6 3.152 3.267 4.661 1.334 12.414 4.743 × 10^5 4.00 TeV 4.000 × 10^6 3.187 4.423 6.292 1.805 15.706 5.457 × 10^5 8.00 TeV 8.000 × 10^6 3.272 9.104 12.858 3.767 29.002 7.303 × 10^5 10.0 TeV 1.000 × 10^7 3.300 11.471 16.165 4.778 35.715 7.924 × 10^5 14.0 TeV 1.400 × 10^7 3.343 16.197 22.754 6.861 49.155 8.875 × 10^5 20.0 TeV 2.000 × 10^7 3.389 23.345 32.692 10.062 69.488 9.896 × 10^5 30.0 TeV 3.000 × 10^7 3.443 35.247 49.229 15.617 103.536 1.107 × 10^6 40.0 TeV 4.000 × 10^7 3.481 47.214 65.819 21.319 137.834 1.190 × 10^6 80.0 TeV 8.000 × 10^7 3.576 95.214 132.233 45.251 276.274 1.391 × 10^6 100. TeV 1.000 × 10^8 3.607 119.283 165.479 57.657 346.027 1.456 × 10^6