Muons in nihonium (Nh)

Z A [g/mol] ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 113 (Nh)[286.18221(6)] ?? 1171.0 0.28517 3.0000 0.6818 3.0000 6.6925 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 3.490 3.490 1.714 × 10^0 14.0 MeV 5.616 × 10^1 2.823 2.823 2.999 × 10^0 20.0 MeV 6.802 × 10^1 2.275 2.275 5.389 × 10^0 30.0 MeV 8.509 × 10^1 1.816 1.816 1.037 × 10^1 40.0 MeV 1.003 × 10^2 1.578 1.578 1.631 × 10^1 80.0 MeV 1.527 × 10^2 1.227 1.227 4.587 × 10^1 100. MeV 1.764 × 10^2 1.167 1.167 6.262 × 10^1 140. MeV 2.218 × 10^2 1.111 1.111 9.790 × 10^1 200. MeV 2.868 × 10^2 1.091 0.000 1.092 1.525 × 10^2 207. MeV 2.943 × 10^2 1.091 0.000 1.092 Minimum ionization 300. MeV 3.917 × 10^2 1.106 0.000 0.000 1.107 2.437 × 10^2 400. MeV 4.945 × 10^2 1.134 0.000 0.000 1.135 3.330 × 10^2 800. MeV 8.995 × 10^2 1.236 0.001 0.000 1.238 6.693 × 10^2 1.00 GeV 1.101 × 10^3 1.273 0.002 0.000 1.276 8.284 × 10^2 1.40 GeV 1.502 × 10^3 1.331 0.003 0.000 1.335 1.134 × 10^3 2.00 GeV 2.103 × 10^3 1.391 0.005 0.000 0.001 1.398 1.573 × 10^3 3.00 GeV 3.104 × 10^3 1.457 0.009 0.003 0.001 1.471 2.269 × 10^3 4.00 GeV 4.104 × 10^3 1.502 0.014 0.006 0.001 1.524 2.937 × 10^3 8.00 GeV 8.105 × 10^3 1.600 0.034 0.025 0.003 1.663 5.440 × 10^3 10.0 GeV 1.011 × 10^4 1.629 0.045 0.036 0.004 1.715 6.624 × 10^3 14.0 GeV 1.411 × 10^4 1.670 0.068 0.061 0.005 1.805 8.895 × 10^3 20.0 GeV 2.011 × 10^4 1.710 0.107 0.101 0.007 1.926 1.211 × 10^4 30.0 GeV 3.011 × 10^4 1.752 0.175 0.182 0.010 2.120 1.706 × 10^4 40.0 GeV 4.011 × 10^4 1.779 0.247 0.270 0.014 2.312 2.157 × 10^4 80.0 GeV 8.011 × 10^4 1.840 0.559 0.663 0.027 3.091 3.649 × 10^4 100. GeV 1.001 × 10^5 1.859 0.724 0.876 0.033 3.495 4.258 × 10^4 112. GeV 1.122 × 10^5 1.869 0.826 1.006 0.037 3.739 Muon critical energy 140. GeV 1.401 × 10^5 1.887 1.063 1.314 0.047 4.312 5.287 × 10^4 200. GeV 2.001 × 10^5 1.916 1.593 2.009 0.066 5.586 6.507 × 10^4 300. GeV 3.001 × 10^5 1.949 2.496 3.169 0.099 7.715 8.025 × 10^4 400. GeV 4.001 × 10^5 1.973 3.428 4.372 0.133 9.907 9.167 × 10^4 800. GeV 8.001 × 10^5 2.029 7.273 9.305 0.268 18.877 1.204 × 10^5 1.00 TeV 1.000 × 10^6 2.048 9.245 11.829 0.336 23.460 1.299 × 10^5 1.40 TeV 1.400 × 10^6 2.076 13.194 16.860 0.476 32.608 1.443 × 10^5 2.00 TeV 2.000 × 10^6 2.106 19.228 24.539 0.689 46.564 1.597 × 10^5 3.00 TeV 3.000 × 10^6 2.141 29.292 37.295 1.053 69.783 1.771 × 10^5 4.00 TeV 4.000 × 10^6 2.166 39.482 50.188 1.422 93.260 1.894 × 10^5 8.00 TeV 8.000 × 10^6 2.228 80.524 102.002 2.951 187.707 2.191 × 10^5 10.0 TeV 1.000 × 10^7 2.248 101.189 128.044 3.735 235.219 2.286 × 10^5 14.0 TeV 1.400 × 10^7 2.279 142.407 180.009 5.343 330.040 2.429 × 10^5 20.0 TeV 2.000 × 10^7 2.313 204.562 258.286 7.806 472.969 2.580 × 10^5 30.0 TeV 3.000 × 10^7 2.351 308.136 388.503 12.059 711.052 2.751 × 10^5 40.0 TeV 4.000 × 10^7 2.379 412.071 519.020 16.411 949.883 2.872 × 10^5 80.0 TeV 8.000 × 10^7 2.447 827.765 1041.439 34.562 1906.216 3.164 × 10^5 100. TeV 1.000 × 10^8 2.470 1035.730 1302.880 43.930 2385.012 3.257 × 10^5