Muons in silver bromide (AgBr)

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.43670 6.473 486.6 0.24582 2.6820 0.0352 3.2109 5.6139 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 4.750 4.750 1.191 × 10^0 14.0 MeV 5.616 × 10^1 3.750 3.750 2.149 × 10^0 20.0 MeV 6.802 × 10^1 2.961 2.961 3.969 × 10^0 30.0 MeV 8.509 × 10^1 2.324 2.324 7.831 × 10^0 40.0 MeV 1.003 × 10^2 1.999 2.000 1.250 × 10^1 80.0 MeV 1.527 × 10^2 1.526 1.526 3.609 × 10^1 100. MeV 1.764 × 10^2 1.441 1.441 4.961 × 10^1 140. MeV 2.218 × 10^2 1.359 1.359 7.832 × 10^1 200. MeV 2.868 × 10^2 1.319 1.319 1.233 × 10^2 247. MeV 3.366 × 10^2 1.314 1.314 Minimum ionization 300. MeV 3.917 × 10^2 1.318 0.000 0.000 1.318 1.993 × 10^2 400. MeV 4.945 × 10^2 1.337 0.000 0.000 1.337 2.747 × 10^2 800. MeV 8.995 × 10^2 1.423 0.001 0.000 1.424 5.642 × 10^2 1.00 GeV 1.101 × 10^3 1.458 0.001 0.000 1.459 7.029 × 10^2 1.40 GeV 1.502 × 10^3 1.513 0.001 0.000 0.001 1.516 9.715 × 10^2 2.00 GeV 2.103 × 10^3 1.574 0.002 0.001 0.001 1.578 1.359 × 10^3 3.00 GeV 3.104 × 10^3 1.641 0.004 0.003 0.001 1.650 1.978 × 10^3 4.00 GeV 4.104 × 10^3 1.688 0.006 0.005 0.002 1.701 2.574 × 10^3 8.00 GeV 8.105 × 10^3 1.794 0.015 0.015 0.003 1.828 4.834 × 10^3 10.0 GeV 1.011 × 10^4 1.826 0.020 0.021 0.004 1.871 5.915 × 10^3 14.0 GeV 1.411 × 10^4 1.872 0.030 0.034 0.006 1.942 8.011 × 10^3 20.0 GeV 2.011 × 10^4 1.917 0.047 0.055 0.008 2.027 1.103 × 10^4 30.0 GeV 3.011 × 10^4 1.964 0.077 0.095 0.012 2.149 1.582 × 10^4 40.0 GeV 4.011 × 10^4 1.996 0.109 0.140 0.015 2.261 2.036 × 10^4 80.0 GeV 8.011 × 10^4 2.066 0.247 0.334 0.030 2.678 3.658 × 10^4 100. GeV 1.001 × 10^5 2.087 0.320 0.440 0.037 2.884 4.378 × 10^4 140. GeV 1.401 × 10^5 2.118 0.470 0.656 0.051 3.296 5.674 × 10^4 200. GeV 2.001 × 10^5 2.150 0.704 0.999 0.073 3.927 7.340 × 10^4 239. GeV 2.391 × 10^5 2.166 0.859 1.220 0.087 4.333 Muon critical energy 300. GeV 3.001 × 10^5 2.186 1.105 1.572 0.109 4.974 9.599 × 10^4 400. GeV 4.001 × 10^5 2.212 1.519 2.167 0.146 6.045 1.142 × 10^5 800. GeV 8.001 × 10^5 2.274 3.231 4.605 0.295 10.407 1.641 × 10^5 1.00 TeV 1.000 × 10^6 2.295 4.111 5.853 0.370 12.630 1.815 × 10^5 1.40 TeV 1.400 × 10^6 2.326 5.875 8.343 0.525 17.070 2.086 × 10^5 2.00 TeV 2.000 × 10^6 2.359 8.575 12.144 0.759 23.838 2.382 × 10^5 3.00 TeV 3.000 × 10^6 2.397 13.084 18.460 1.161 35.103 2.726 × 10^5 4.00 TeV 4.000 × 10^6 2.425 17.654 24.844 1.569 46.493 2.973 × 10^5 8.00 TeV 8.000 × 10^6 2.492 36.086 50.512 3.262 92.354 3.572 × 10^5 10.0 TeV 1.000 × 10^7 2.515 45.377 63.417 4.132 115.441 3.765 × 10^5 14.0 TeV 1.400 × 10^7 2.549 63.909 89.163 5.917 161.539 4.057 × 10^5 20.0 TeV 2.000 × 10^7 2.585 91.877 127.950 8.654 231.068 4.365 × 10^5 30.0 TeV 3.000 × 10^7 2.627 138.436 192.487 13.385 346.937 4.716 × 10^5 40.0 TeV 4.000 × 10^7 2.658 185.169 257.181 18.228 463.237 4.965 × 10^5 80.0 TeV 8.000 × 10^7 2.733 372.400 516.142 38.455 929.731 5.562 × 10^5 100. TeV 1.000 × 10^8 2.758 466.183 645.744 48.903 1163.590 5.754 × 10^5