Meson Summary Table 31313131

!(1600)

!(1600)^{[p]} I^G (J^{PC} ) = 0�(1 � �)

Mass m = 1662 � 13 MeV Full width Γ = 280 � 24 MeV

ω(1600) DECAY MODES ω(1600) DECAY MODES Fraction (Γi /Γ) p (MeV/c)

ρπ seen 644 ω π π seen 610 e+ e− seen 831

!_3(1670)

!_3(1670) I^G (J^{PC} ) = 0�(3 � �)

Mass m = 1668 � 5 MeV Full width Γ = 173 � 11 MeV [k]

ω3(1670) DECAY MODES ω3(1670) DECAY MODES Fraction (Γi /Γ) p (MeV/c)

ρπ seen 647 ω π π seen 614 b1(1235)π possibly seen 359

ß_2(1670) ß_2(1670) I^G (J^{PC} ) = 1�(2 �^+)

Mass m = 1670 � 20 MeV [k] Full width Γ = 240 � 15 MeV [k] (S = 1.1) Γee = 1.35 � 0.26 keV

π2(1670) DECAY MODES π2(1670) DECAY MODES Fraction (Γi /Γ) p (MeV/c)

f2(1270)π (56.2±3.2) % 325 π± π+ π− (53 ±4 ) % – ρπ (31 ±4 ) % 649 f0(1300)π ( 8.7±3.4) % – K K ∗(892)+ c.c. ( 4.2±1.4) % 453 γ γ ( 5.6±1.1) × 10−6 835 η π < 5 % 738 π± 2π+ 2π− < 5 % 734