Meson Summary Table 53535353

D_1(2420)^0

D_1(2420)^0 I (J^P ) =^1_2 (1^+)

I, J, P need confirmation.

Mass m = 2422:8 ± 3:2 MeV (S = 1.6) Full width Γ = 18+6− 4 MeV

D1(2420)0 modes are charge conjugates of modes below.

D1(2420)0 DECAY MODES

D1(2420)0 DECAY MODES Fraction (Γi /Γ) p (MeV/c)

D∗(2010)+ ß− seen 355 D+ ß− not seen 474

D^�_2(2460)

D^�_2(2460) I (J^P ) =^1_2 (2^+)

JP = 2+ assignment strongly favored (ALBRECHT 89B).

Mass mD�_2(2460)_0 = 2457:7 ± 1:9 MeV Mass mD�_2(2460)� = 2456 ± 6 MeV (S = 2.0) mD�_2(2460)� − mD�_2(2460)_0 = 2 ± 5 MeV (S = 1.4) Full width ΓD�_2(2460)_0 = 21 ± 5 MeV Full width ΓD�_2(2460)� = 23 ± 10 MeV

D∗2(2460) modes are charge conjugates of modes below.

D∗2(2460) DECAY MODES

D∗2(2460) DECAY MODES Fraction (Γi /Γ) p (MeV/c)

D∗2(2460)0 → D+ ß− seen 503 D∗2(2460)0 → D∗(2010)+ ß− seen 387

D∗2(2460)± → D0 ß+ seen 505