Meson Summary Table 75757575

bb MESONS

�(1S)�(1S)�(1S)�(1S)_{or �(9460)}

or �(9460) or �(9460)^{I G (JPC ) = ??(1 − −)}

Mass m = 9460.37 ± 0.21 MeV (S = 2.7) Full width Γ = 52.5 ± 1.8 keV Γee = 1.32 ± 0.03 keV

Scale factor/ p Υ(1S) DECAY MODES

Υ(1S) DECAY MODES Fraction (Γi /Γ) Confidence level (MeV/c)

τ + τ − (2:97±0:35) % 4384 e+ e− (2:52±0:17) % 4730 μ+ μ− (2:48±0:07) % S=1.1 4729

Hadronic decays J/ψ(1S)anything (1:1 ±0:4 ) × 10−3 4223

ρπ ¡ 2 × 10^{−4} CL=90% 4698

π+ π− ¡ 5 × 10−4 CL=90% 4728 K + K − ¡ 5 × 10−4 CL=90% 4704

p p ¡ 9 × 10^{−4} CL=90% 4636

Radiative decays γ 2h+ 2h− (7:0 ±1:5 ) × 10−4 4720 γ 3h+ 3h− (5:4 ±2:0 ) × 10−4 4703 γ 4h+ 4h− (7:4 ±3:5 ) × 10−4 4679 γ π+ π− K + K − (2:9 ±0:9 ) × 10−4 4686 γ 2π+ 2π− (2:5 ±0:9 ) × 10−4 4720 γ 3π+ 3π− (2:5 ±1:2 ) × 10−4 4703 γ 2π+ 2π− K + K − (2:4 ±1:2 ) × 10−4 4658 γ π+ π− p p (1:5 ±0:6 ) × 10−4 4604 γ 2π+ 2π− p p (4 ±6 ) × 10−5 4563 γ 2K + 2K − (2:0 ±2:0 ) × 10−5 4601 γ η′(958) ¡ 1:3 × 10−3 CL=90% 4682

γ η ¡ 3:5 × 10^{−4} CL=90% 4714

γ f ′2(1525) ¡ 1:4 × 10−4 CL=90% 4607 γ f2(1270) ¡ 1:3 × 10−4 CL=90% 4644 γ η(1440) ¡ 8:2 × 10−5 CL=90% 4624 γ fJ (1710) → γ K K ¡ 2:6 × 10−4 CL=90% 4576 γ f4(2220) → γ K + K − ¡ 1:5 × 10−5 CL=90% 4469