ERRATA PAGE 3 — for the 1994 Review of Particle Properties

[L. Montanet et al., Phys. Rev. D50, 1173 (1994)] — (URL: http://pdg.lbl.gov/rpp/errata) (All errata have been corrected on the World-Wide Web.)

October 17, 1994

• On page 1233 (p. 3 of the Booklet), the value of an Å is incorrect. It should read:

1Å ≡ 0.1 nm

November 21, 1994

ERRATA for the B^+, B^0

• On pages 1207–1210, in the Summary Tables for the full Review, the footnote labels are wrong for the B^+ and B^0.

(They are correct in the Full Listings and the booklet.) We give a translation table:

B^+ section B^0 section Correction Occurrences Correction Occurrences a → rr 1 a → ww 1 b → ii 14 b → ii 4 c → ss 3 c → q 6 d → tt 1 e → uu 1 f → q 3 g → vv 3

More ERRATA for a Cross-Section Plot

(See the errata for page 1333 under January 31, 1995) • On page 1333, for the top figure, the equation for the variable ϵ_p is wrong. It should read . . .in terms of just one variable ϵ_p has found the most use: dN dx_p = 1 x_p[1 − (1/x_p) − ϵ_p/(1 − x_p)]^2 .

December 6, 1994

ERRATA for the Standard Model Section

• On page 1305, three lines after (26.11)

. . . 1 − α_s(m_t)(π^2 + 3)/9π ∼ 0.9 . . .

should read

. . . 1 − 2α_s(m_t)(π^2 + 3)/9π ∼ 0.9 . . .