ERRATA PAGE 5 — for the 1994 Review of Particle Properties

[L. Montanet et al., Phys. Rev. D50, 1173 (1994)] — (URL: http://pdg.lbl.gov/rpp/errata) (All errata have been corrected on the World-Wide Web.)

January 31, 1995

ERRATA for the Particle detectors section

• On page 1262 (page 147 of the Booklet), there is a μ missing from the second square root in Eq. 12.6. W = r_{2ϵ (V + Vbi)} ne = p_{2ρμϵ(V + Vbi) , (12.6)} ERRATA for the Plots of cross sections and related quantities section

(See the errata for page 1333 under November 21, 1994)

• On page 1333, there is an error in the y axis of the figure and in the figure caption for the figure on “Heavy Quark Fragmentation” on the top of the page. To wit, the ‘σ·B’ should be ‘s B’. We have also added another sentence to the figure caption to define B.

. . . inclusive cross sections (s B dσ/dxp, with xp = p/p_{max}) for the production of pseudoscalar D^0 and vector D�^+ in e^+e� annihilations at √ s ∼10 GeV. For the D^0, B is the branching ratio for D^0 → K�π^+, while in the D�^+ case B is the product branching ratio for D�^+ → D^0π^+ followed by D^0 → K�π^+. . . .

March 6, 1995

ERRATA for the W Decay Modes

• On page 1191 (page 6 of the Booklet) and page 1352, the W → ℓν fraction should be (10.8 ± 0.4)%, not (10.7 ± 0.5)%.

On page 1353, the data block header for Γ(ℓ^+ν)/Γ_{total} incorrectly defines this branching ratio as the arithmetic average of the e^+ℓ, μ^+ν, and τ^+ν fitted values. This datablock should show the value 0.108 � 0.004 AVERAGE which is the weighted average of eν and μν data. τ ν data are not included because there are no measurements of the absolute τ ν fraction, only the τ ν/eν ratio. Please note that the presentation order of the W DECAY MODES and BRANCHING RATIOS has changed: i.e., the ℓ^+ν decay mode has been moved to be the first decay mode; the corresponding branching ratio has also been moved.

March 15, 1995

ERRATA for Passage of particles through matter Section

• On page 1252 (page 126 of the Booklet), a factor of Z was left out of the expression for mean excitation energy. The paragraph should begin:

The mean excitation energy I is (10 ± 1 eV) × Z for elements . . . (see further errata under Dec. 14, 1994)

ERRATA for Statistics Section

• On page 1279, Table 17.2, the heading for column 2 should read 31.73 not 31.67. The last entry in the first row should read 235.8 not 235.78.

• Also on page 1279, Fig. 17.4 (page 172 of the Booklet), the caption should read:

. . . gives summed probabilty ε = 10%. The dotted summed probability . . .