ERRATA PAGE 7 — for the 1994 Review of Particle Properties

[L. Montanet et al., Phys. Rev. D50, 1173 (1994)] — (URL: http://pdg.lbl.gov/rpp/errata) (All errata have been corrected on the World-Wide Web.)

August 15, 1995

ERRATA for the Statistics section

• On page 1277, Eq. (17.25) has incorrect subscripts in four places. Here is the correct version:

( ^y − y_{true})^2 | | |_{est} = 1 S_{11} + S_{11} D ( x − S_{12} S_{11}

)_2 . (17.25)

• On page 1282 (page 174 of the Booklet), Eq. (17.37) has one incorrect index. The numerator in the second fraction should be ∂^2f_j , not ∂^2f_n. The correct version is V_{ij}( ^f ) ≈ ∑ n,m ∂f_i ∂y_n | | | | ^y ∂f_j ∂y_m | | | | ^y V_{nm}(^y ) . (17.37)

ERRATA for the B^0

• On page 1636, in Table 1, there is an error in the fifth column of the table for the row b → ssd. It should read ‘−’, not ‘0’.

September 26, 1995

ERRATA for Passage of particles through matter Section

• On page 1251 (page 125 of the Booklet), in Table 10.1, in the line for X_0 Radiation length, there is an error in the units column. The corrected line should read:

X_0 Radiation length g�^1 cm^2.

• On page 1254 (page 133 of the Booklet), after Eq. (10.19), the end of the sentence should read:

. . . for the jth element.

October 3, 1995

ERRATA for SU(3) isocalar factors and representation matrices Section

• On page 1288, on the right-hand side, for the matrices 10 → 8 ⊗ 8, the top line of the second matrix should read N π ΣK not N π N η. 10 → 8 ⊗ 8 Δ Σ Ξ Ω → N π ΣK N K Σπ Λπ Ση ΞK ΣK ΛK Ξπ Ξη ΞK . . .