Types of Computers/Systems Used

Resp. PC MAC NEXT VMS UNIX Mainframe Other Total 2468 1011 1253 232 1661 1687 247 89 Exper. 1610 712 907 72 1279 1131 177 33 Theory 697 250 285 140 310 446 52 49

UNIX versus VMS Usage

No. of Resp. = 2225 Uses UNIX Do Not Use UNIX Uses VMS 1123 538 Do Not Use VMS 564 269

Computers Used For

No. of Resp. = 2472 Email WWW Word Proc XWindow Spreadsheet Numerical Algebraic 2452 2095 2270 1789 949 2095 1195

Video Conferencing

Have Used Found Useful Room Based 1010 824 Workstation Based 371 294